X11R7.7 Manual Pages: Section 7: Miscellaneous

Documentation for the X Window System Version 11 Release 7.7 (X11R7.7)

XConsortium − X Consortium information

XStandards − X Window System Standards and Specifications

X - a portable, network-transparent window system

xkeyboard-config − XKB data description files

XOrgFoundation - X.Org Foundation information

XProjectTeam - X.Org Group information

Xsecurity - X display access control