        [This is the HELP TEKVEW file  (1 page)]

TEKVEW:  This program allows you to view on  a  Tektronix  terminal  a
       file  previously created using the TEKDSK library.  After every
       screen erase it sends out enough nul chararters so  as  to  not
       miss any characters immediately after the erase.  To RUN TEKVEW
       type
                        .R TEKVEW


       The program asks the  filename  (default  ".TEK")  to  display.
       Full   file   specification  and  wild  cards  (*  and  ?)  are
       permissible.  After plotting the each frame, the program  beebs
       and  waits  for a carriage-return to be typed before continuing
       with the next frame, or exiting the program.

       Note:  The tty LINK facility does not correctly  handle  output
       from TEKVEW which uses packed image mode.

[end of TEKVEW.HLP]

.KJOB
.
