[SPACING HELP  1 page]

The value of the /SPACING switch in the print command is SINGLE by
default, and can be DOUBLE, or TRIPLE.  For example,

PRINT NEAT.FIL/SPACING:DOUBLE

[end of SPACING HELP]

.KJOB
.
