[HLP:PHONES.HLP (1 page)]

All lines now "DETACH" when you get disconnected.  To reconnect,
dial any number, login again, and answer "YES" to LOGIN when it
asks if you want to connect to your other "DETACHED" job.

Phone numbers are as follows:                           29-Apr-83
   543-9591    300 bits per second (1 line) - Bell         TTY331
   543-9592   1200 bits per second (1 line) - Vadic/Bell   TTY332

Computer operator number:  543-9275.

[end of PHONES.HLP]


.KJOB
.Connection closed by foreign host.
$ r
telnet ks10.hs.washington.edu
