[HELP PAL10 1 page]

PAL10 is the PDP-8 cross assembler for the PDP-8  PAL assembler.  To run
PAL10 type "R PAL10".  Information on PAL is in PDP-8 manuals, and PAL10
creates a BIN-loader compatible file, with extension .BIN , and a listing
file with extension .LST .

[End PAL10.HLP]

.KJOB
.
