[JOB.HLP  a few lines]

Here are a few things to be said about JOBs on the Locke Computer.

1. When you LOGIN,  you are assigned a JOB NUMBER  from 1
        to JOBMAX (currently, today, JOBMAX is 132).
2. Your JOB NUMBER may be seen by giving the PJOB command (abbrev PJ)
3. SYSTAT shows each job's JOB NUMBER as the first item in the listing.
4. The JOB lasts until LOGOUT, at which time your JOB slot is empty, and
   someone else will get it when they LOGIN.
5. If you are looking for a programming job, it doesnt hurt to ask
   in T271D. A list is kept of those wanting to do programming for users.

.KJOB
.
