[HELP ARP 1 page]

ARP is the original name of a set of DECUS-supplied character-routines
for FORTRAN.  They have been rewritten for efficiency and installed into
the regular FORTRAN library, so that they are loaded automatically when
called from FORTRAN.  The list of all such routines added to FORLIB at the
Locke Computer Center is in the HELP FORLIB help file.
For information, type
        HELP FORLIB
[End HELP ARP]

.KJOB
.
