D. VAN NOSTRAND COMPANY

23 MURRAY AND 27 WARREN STREETS

New York

SHORT-TITLE CATALOG

OF

Publications and Importations

OF

SCIENTIFIC AND ENGINEERING
BOOKS

This list includes the technical publications of the following English publishers:

SCOTT, GREENWOOD & CO.

CONSTABLE & COMPANY, Ltd.

CROSBY LOCKWOOD & SON

TECHNICAL PUBLISHING CO.

ELECTRICIAN PRINTING & PUBLISHING CO.

for whom D. Van Nostrand Company are the sole American agents.

August, 1910

Short-Title Catalog

OF THE

Publications and Importations

OF

D. VAN NOSTRAND COMPANY

23 MURRAY AND 27 WARREN STREETS, N. Y.

Price marked with an asterisk (*) are NET.

All bindings are in cloth unless otherwise noted.

A B C Code. (See Clausen-Thue.) |  |
Abbott, A. V. The Electrical Transmission of Energy. | 8vo, | *$5 00
Adam, P. Practical Bookbinding. Trans. by T. E. Maw. | 12mo, | *2 50
Adams, J. W. Sewers and Drains for Populous Districts. | 8vo, | 2 50
Addyman, F. T. Practical X-Ray Work. | 8vo, | *4 00
A1 Code. (See Clausen-Thue.) |  |
Aikman, C. M. Manures and the Principles of Manuring. | 8vo, | 2 50
Alexander, J. H. Elementary Electrical Engineering. | 12mo, | 2 00
—— Model Balloons and Flying Machines. | 12mo, |
—— Universal Dictionary of Weights and Measures. | 8vo, | 3 50
Allen, H. Modern Power Gas Producer Practice and Applications. | 12mo, | *2 50
—— Gas and Oil Engines. | 8vo, | *4 50
Anderson, F. A. Boiler Feed Water. | 8vo, | *2 50
Anderson, Capt. G. L. Handbook for the Use of Electricians. | 8vo, | 3 00
Anderson, J. W. Prospector’s Handbook. | 12mo, | 1 50
Andés, L. Vegetable Fats and Oils. | 8vo, | *4 00
—— Animal Fats and Oils. Trans. by C. Salter. | 8vo, | *4 00
—— Drying Oils, Boiled Oil, and Solid and Liquid Driers. | 8vo, | *5 00
—— Iron Corrosion, Anti-fouling and Anti-corrosive Paints. Trans. by C. Salter. | 8vo, | *4 00
—— Oil Colors, and Printers’ Ink. Trans. by A. Morris and H. Robson. | 8vo, | *2 50
—— Treatment of Paper for Special Purposes. Trans. by C. Salter. | 12mo, | *2 50
Annual Reports on the Progress of Chemistry. |  |
Vol. I. (1904). | 8vo, | *2 00
Vol. II. (1905). | 8vo, | *2 00
Vol. III. (1906). | 8vo, | *2 00
Vol. IV. (1907). | 8vo, | *2 00
Vol. V. (1908). | 8vo, | *2 00
Vol. VI. (1909). | 8vo, | *2 00
Arnold, E. Armature Windings of Direct-Current Dynamos. Trans. by F. B. DeGress. | 8vo, | *2 00
Ashe, S. W., and Keiley, J. D. Electric Railways. Theoretically and Practically Treated. Vol. I. Rolling Stock. | 12mo, | *2 50
Ashe, S. W. Electric Railways. Vol. II. Engineering Preliminaries and Direct Current Sub-Stations. | 12mo, | *2 50
—— Electricity: Experimentally and Practically Applied. | 12mo, | *2 00
Atkinson, A. A. Electrical and Magnetic Calculations. | 8vo, | *1 50
Atkinson, P. The Elements of Electric Lighting. | 12mo, | 1 50
—— The Elements of Dynamic Electricity and Magnetism. | 12mo, | 2 00
—— Power Transmitted by Electricity. | 12mo, | 2 00
Auchincloss, W. S. Link and Valve Motions Simplified. | 8vo, | *1 50
Ayrton, H. The Electric Arc. | 8vo, | *5 00
Bacon, F. W. Treatise on the Richards Steam-Engine Indicator. | 12mo, | 1 00
Bailes, G. M. Modern Mining Practice. Five Volumes. | 8vo, each, | 3 50
Bailey, R. D. The Brewers’ Analyst. | 8vo, | *5 00
Baker, A. L. Quaternions. | 8vo (In Preparation.) |
Baker, M. N. Potable Water. (Science Series.). | 16mo, | 0 50
Baker, T. T. Telegraphic Transmission of Photographs. | 12mo, | *1 25
Bale, G. R. Modern Iron Foundry Practice. Two Volumes. | 12mo. |
Vol. I. Foundry Equipment, Materials Used. |  | *2 50
Vol. II. Machine Moulding and Moulding Machines. |  | *1 50
Bale, M. P. Pumps and Pumping. | 12mo, | 1 50
Ball, R. S. Popular Guide to the Heavens. | 8vo, | *4 50
—— Natural Sources of Power. (Westminster Series.). | 8vo, | *2 00
Ball, W. V. Law Affecting Engineers. | 8vo, | *3 50
Barba, J. Use of Steel for Constructive Purposes. | 12mo, | 1 00
Barker, A. H. Graphic Methods of Engine Design. | 12mo, | *1 50
Barker, A. Textiles and Their Manufacture. (Westminster Series.). | 8vo, | 2 00
Barnard, F. A. P. Report on Machinery and Processes of the Industrial Arts and Apparatus of the Exact Sciences at the Paris Universal Exposition, 1867. | 8vo, | 5 00
Barnard, J. H. The Naval Militiaman’s Guide. | 16mo, leather | 1 25
Barrus, G. H. Boiler Tests. | 8vo, | *3 00
—— Engine Tests. | 8vo, | *4 00
The above two purchased together. |  | *6 00
Barwise, S. The Purification of Sewage. | 12mo, | 3 50
Baterden, J. R. Timber. (Westminster Series.). | 8vo, | *2 00
Beadle, C. Chapters on Papermaking. Five Volumes. | 12mo, each, | *2 00
Beaumont, R. Color in Woven Design. | 8vo, | 7 50
—— Finishing of Textile Fabrics. | 8vo, | *4 00
Beaumont, W. W. The Steam-Engine Indicator. | 8vo, | 2 50
Bedell, F., and Pierce, C. A. Direct and Alternating Current Testing. | 8vo, | *2 00
Beech, F. Dyeing of Cotton Fabrics. | 8vo, | *3 00
—— Dyeing of Woolen Fabrics. | 8vo, | *3 50
Beckwith, A. Pottery. | 8vo, paper, | 0 60
Begtrup, J. The Slide Valve. | 8vo, | *2 00
Bennett, H. G. The Manufacture of Leather. | 8vo, | *4 50
Bernthsen, A. A Text-book of Organic Chemistry. Trans. by G. M’Gowan. | 12mo, | *2 50
Berry, W. J. Differential Equations of the First Species. |  | 12mo (In Preparation.)
Bersch, J. Manufacture of Mineral and Lake Pigments. Trans. by A. C. Wright. | 8vo, | *5 00
Bertin, L. E. Marine Boilers. Trans. by L. S. Robertson. | 8vo, | 5 00
Beveridge, J. Papermaker’s Pocket Book. | 12mo, | *4 00
Binns, C. F. Ceramic Technology. | 8vo, | *5 00
—— Manual of Practical Potting. | 8vo, | *7 50
—— The Potter’s Craft. | 12mo, | *2 00
Birchmore, W. H. How to Use a Gas Analysis. | 12mo, | *1 25
Blaine, R. G. The Calculus and Its Applications. | 12mo, | *1 50
Blake, W. H. Brewers’ Vade Mecum. | 8vo, | *4 00
Blake, W. P. Report upon the Precious Metals. | 8vo, | 2 00
Bligh, W. G. The Practical Design of Irrigation Works. | 8vo, | *6 00
Blyth, A. W. Foods: Their Composition and Analysis. | 8vo, | 7 50
—— Poisons: Their Effects and Detection. | 8vo, | 7 50
Böckmann, F. Celluloid. | 12mo, | *2 50
Bodmer, G. R. Hydraulic Motors and Turbines. | 12mo, | 5 00
Boileau, J. T. Traverse Tables. | 8vo, | 5 00
Bonney, G. E. The Electro-platers’ Handbook. | 12mo, | 1 20
Booth, W. H. Water Softening and Treatment. | 8vo, | *2 50
—— Superheaters and Superheating and Their Control. | 8vo, | *1 50
Bottcher, A. Cranes: Their Construction, Mechanical Equipment and Working. Trans. by A. Tolhausen. | 4to, | *10 00
Bottler, M. Modern Bleaching Agents. Trans. by C. Salter. | 12mo, | *2 50
Bottone, S. R. Magnetos for Automobilists. | 12mo, | *1 00
Bourry, E. Treatise on Ceramic Industries. Trans. by W. P. Rix. |  | 8vo, (In Press.)
Bow, R. H. A Treatise on Bracing. | 8vo, | 1 50
Bowie, A. J., Jr. A Practical Treatise on Hydraulic Mining. | 8vo, | 5 00
Bowker, W. R. Dynamo, Motor and Switchboard Circuits. | 8vo, | *2 50
Bowles, O. Tables of Common Rocks. (Science Series.). | 16mo, | 0 50
Bowser, E. A. Elementary Treatise on Analytic Geometry. | 12mo, | 1  75
—— Elementary Treatise on the Differential and Integral Calculus. | 12mo, | 2 25
—— Elementary Treatise on Analytic Mechanics. | 12mo, | 3 00
—— Elementary Treatise on Hydro-mechanics. | 12mo, | 2 50
—— A Treatise on Roofs and Bridges. | 12mo, | *2 25
Boycott, G. W. M. Compressed Air Work and Diving. | 8vo, | *4 00
Bragg, E. M. Marine Engine Design. |  | 12mo (In Press.)
Brassey’s Naval Annual for 1910. | 8vo, | *6 00
Brewer, R. W. A. The Motor Car. | 12mo, | *2 00
Bright, C. The Life Story of Sir Charles Tilson Bright. | 8vo, | *4 50
British Standard Sections. Complete list of this series (45 parts) sent on application. | 8×15 | *1 00
Brown, H. Irrigation. | 8vo, | *5 00
Brown, Wm. N. The Art of Enamelling on Metal. | 12mo, | *1 00
—— Handbook on Japanning and Enamelling. | 12mo, | *1 50
—— House Decorating and Painting. | 12mo, | *1 50
—— History of Decorative Art. | 12mo, | *1 25
—— Dipping, Burnishing, Lacquering and Bronzing Brass Ware. | 12mo, | *1 00
—— Workshop Wrinkles. | 8vo, | *1 00
Bruce, E. M. Pure Food Tests. | 12mo, | *1 25
Bruhns, Dr. New Manual of Logarithms. | 8vo, half morocco, | 2 50
Brunner, R. Manufacture of Lubricants, Shoe Polishes and Leather Dressings. Trans. by C. Salter. | 8vo, | *3 00
Bulman, H. F., and Redmayne, R. S. A. Colliery Working and Management. | 8vo, | 6 00
Burgh, N. P. Modern Marine Engineering. | 4to, half morocco, | 10 00
Burt, W. A. Key to the Solar Compass. | 16mo, leather, | 2 50
Burton, F. G. Engineering Estimates and Cost Accounts. | 12mo, | *1 50
Buskett, E. W. Fire Assaying. | 12mo, | *1 25
Cain, W. Brief Course in the Calculus. | 12mo, | *1 75
—— Theory of Steel-concrete Arches and of Vaulted Structures. (Science Series.). | 16mo, | 0 50
Campin, F. The Construction of Iron Roofs. | 8vo, | 2 00
Carpenter, R. C., and Diederichs, H. Internal Combustion Engines. | 8vo, | *5 00
Carter, E. T. Motive Power and Gearing for Electrical Machinery. | 8vo, | *5 00
Carter, H. A. Ramie (Rhea), China Grass. | 12mo, | *2 00
Carter, H. R. Modern Flax, Hemp, and Jute Spinning. | 8vo, | *3 00
Cathcart, W. L. Machine Design. Part I. Fastenings. | 8vo, | *3 00
Cathcart, W. L., and Chaffee, J. I. Course of Graphic Statics. | 8vo (In Press.) |
Caven, R. M., and Lander, G. D. Systematic Inorganic Chemistry. | 12mo, | *2 00
Chambers’ Mathematical Tables. | 8vo, | 1 75
Charnock, G. F. Workshop Practice. (Westminster Series.). | 8vo (In Press.) |
Charpentier, P. Timber. | 8vo, | *6 00
Chatley, H. Principles and Designs of Aeroplanes. (Science Series.). | 16mo, | 0 50
—— How to Use Water Power. | 12mo, | *1 00
Child, C. T. The How and Why of Electricity. | 12mo, | 1 00
Christie, W. W. Boiler-waters, Scale, Corrosion, Foaming. | 8vo, | *3 00
—— Chimney Design and Theory. | 8vo, | *3 00
—— Furnace Draft. (Science Series.). | 16mo, | 0 50
Church’s Laboratory Guide. Rewritten by Edward Kinch. | 8vo, | *2 50
Clapperton, G. Practical Papermaking. | 8vo, | 2 50
Clark, C. H. Marine Gas Engines. | (In Press.) |
Clark, D. K. Rules, Tables and Data for Mechanical Engineers. | 8vo, | 5 00
—— Fuel: Its Combustion and Economy. | 12mo, | 1 50
—— The Mechanical Engineer’s Pocketbook. | 16mo, | 2 00
—— Tramways: Their Construction and Working. | 8vo, | 7 50
Clark. J. M. New System of Laying Out Railway Turnouts. | 12 mo, | 1 00
Clausen-Thue, W. A B C Telegraphic Code. Fourth Edition. | 12mo, | *5 00
Fifth Edition. | 8vo, | *7 00
—— The A1 Telegraphic Code. | 8vo, | *7 50
Cleemann, T. M. The Railroad Engineer’s Practice. | 12mo, | *1 50
Clevenger, S. R. Treatise on the Method of Government Surveying. | 16mo, morocco | 2 50
Clouth, F. Rubber, Gutta-Percha, and Balata. | 8vo, | *5 00
Coffin, J. H. C. Navigation and Nautical Astronomy. | 12mo, | *3 50
Cole, R. S. Treatise on Photographic Optics. | 12mo, | 2 50
Coles-Finch, W. Water, Its Origin and Use. | 8vo, | *5 00
Collins, J. E. Useful Alloys and Memoranda for Goldsmiths, Jewelers. | 16mo, | 0 50
Constantine, E. Marine Engineers, Their Qualifications and Duties. | 8vo, | *2 00
Cooper, W. R. Primary Batteries. | 8vo, | *4 00
—— “The Electrician” Primers. | 8vo, | *5 00
Copperthwaite, W. C. Tunnel Shields. | 4to, | *9 00
Corey, H. T. Water Supply Engineering. | 8vo (In Press.) |
Cornwall, H. B. Manual of Blow-pipe Analysis. | 8vo, | *2 50
Cowell, W. B. Pure Air, Ozone, and Water. | 12mo, | *2 00
Crocker, F. B. Electric Lighting. Two Volumes. | 8vo. |
Vol. I. The Generating Plant. |  | 3 00
Vol. II. Distributing Systems and Lamps. |  | 3 00
Crocker, F. B., and Arendt, M. Electric Motors. | 8vo, | *2 50
Crocker, F. B., and Wheeler, S. S. The Management of Electrical Machinery. | 12mo, | *1 00
Cross, C. F., Bevan, E. J., and Sindall, R. W. Wood Pulp and Its Applications. (Westminster Series.). | 8vo (In Press.) |
Crosskey, L. R. Elementary Perspective. | 8vo, | 1 00
Crosskey, L. R., and Thaw, J. Advanced Perspective. | 8vo, | 1 50
Davenport, C. The Book. (Westminster Series.). | 8vo, | *2 00
Davies, E. H. Machinery for Metalliferous Mines. | 8vo, | 8 00
Davies, D. C. Metalliferous Minerals and Mining. | 8vo, | 5 00
Davies, F. H. Electric Power and Traction. | 8vo, | *2 00
Dawson, P. Electric Traction on Railways. | 8vo, | *9 00
Day, C. The Indicator and Its Diagrams. | 12mo, | *2 00
Deerr, N. Sugar and the Sugar Cane. | 8vo, | *3 00
Deite, C. Manual of Soapmaking. Trans. by S. T. King. | 4to, | *5 00
De la Coux, H. The Industrial Uses of Water. Trans. by A. Morris. | 8vo, | *4 50
Del Mar, W. A. Electric Power Conductors. | 8vo, | *2 00
Denny, G. A. Deep-level Mines of the Rand. | 4to, | *10 00
—— Diamond Drilling for Gold. |  | *5 00
Derr, W. L. Block Signal Operation. | Oblong 12mo, | *1 50
Desaint, A. Three Hundred Shades and How to Mix Them. | 8vo, | *10 00
Dibdin, W. J. Public Lighting by Gas and Electricity. | 8vo, | *8 00
—— Purification of Sewage and Water. | 8vo, | 6 50
Dieterich, K. Analysis of Resins, Balsams, and Gum Resins. | 8vo, | *3 00
Dinger, Lieut. H. C. Care and Operation of Naval Machinery. | 12mo, | *2 00
Dixon, D. B. Machinist’s and Steam Engineer’s Practical Calculator. | 16mo, morocco, | 1 25
Doble, W. A. Power Plant Construction on the Pacific Coast (In Press.) |  |
Dodd, G. Dictionary of Manufactures, Mining, Machinery, and the Industrial Arts. | 12mo, | 1 50
Dorr, B. F. The Surveyor’s Guide and Pocket Table-book. | 16mo, morocco, | 2 00
Down, P. B. Handy Copper Wire Table. | 16mo, | *1 00
Draper, C. H. Elementary Text-book of Light, Heat and Sound. | 12mo, | 1 00
—— Heat and the Principles of Thermo-dynamics. | 12mo, | 1 50
Duckwall, E. W. Canning and Preserving of Food Products. | 8vo, | *5 00
Dumesny, P., and Noyer, J. Wood Products, Distillates, and Extracts. | 8vo, | *4 50
Duncan, W. G., and Penman, D. The Electrical Equipment of Collieries. | 8vo, | *4 00
Duthie, A. L. Decorative Glass Processes. (Westminster Series.). | 8vo, | *2 00
Dyson, S. S. Practical Testing of Raw Materials. | 8vo, | *5 00
Eccles, R. G., and Duckwall, E. W. Food Preservatives. | 8vo, | 1 00
Paper. |  | 0 50
Eddy, H. T. Researches in Graphical Statics. | 8vo, | 1 50
—— Maximum Stresses under Concentrated Loads. | 8vo, | 1 50
Edgcumbe, K. Industrial Electrical Measuring Instruments. | 8vo, | *2 50
Eissler, M. The Metallurgy of Gold. | 8vo, | 7 50
—— The Hydrometallurgy of Copper. | 8vo, | *4 50
—— The Metallurgy of Silver. | 8vo, | 4 00
—— The Metallurgy of Argentiferous Lead. | 8vo, | 5 00
—— Cyanide Process for the Extraction of Gold. | 8vo, | 3 00
—— A Handbook on Modern Explosives. | 8vo, | 5 00
Ekin, T. C. Water Pipe and Sewage Discharge Diagrams. | folio, | *3 00
Eliot, C. W., and Storer, F. H. Compendious Manual of Qualitative Chemical Analysis. | 12mo, | *1 25
Elliot, Major G. H. European Light-house Systems. | 8vo, | 5 00
Ennis, Wm. D. Linseed Oil and Other Seed Oils. | 8vo, | *4 00
—— Applied Thermodynamics. | 8vo (In Press.) |
Erfurt, J. Dyeing of Paper Pulp. Trans. by J. Hubner. | 8vo, | *7 50
Erskine-Murray, J. A Handbook of Wireless Telegraphy. | 8vo, | *3 50
Evans, C. A. Macadamized Roads. | (In Press.) |
Ewing, A. J. Magnetic Induction in Iron. | 8vo, | *4 00
Fairie, J. Notes on Lead Ores. | 12mo, | *1 00
—— Notes on Pottery Clays. | 12mo, | *1 50
Fairweather, W. C. Foreign and Colonial Patent Laws. | 8vo, | *3 00
Fanning, J. T. Hydraulic and Water-supply Engineering. | 8vo, | *5 00
Fauth, P. The Moon in Modern Astronomy. Trans. by J. McCabe. | 8vo, | *2 00
Fay, I. W. The Coal-tar Colors. | 8vo (In Press.) |
Fernbach, R. L. Glue and Gelatine. | 8vo, | *3 00
Fischer, E. The Preparation of Organic Compounds. Trans. by R. V. Stanford. | 12mo, | *1 25
Fish, J. C. L. Lettering of Working Drawings. | Oblong 8vo, | 1 00
Fisher, H. K. C., and Darby, W. C. Submarine Cable Testing. | 8vo, | *3 50
Fiske, Lieut. B. A. Electricity in Theory and Practice. | 8vo, | 2 50
Fleischmann, W. The Book of the Dairy. Trans. by C. M. Aikman. | 8vo, | 4 00
Fleming, J. A. The Alternate-current Transformer. Two Volumes. | 8vo. |
Vol. I. The Induction of Electric Currents. |  | *5 00
Vol. II. The Utilization of Induced Currents. |  | *5 00
—— Centenary of the Electrical Current. | 8vo, | *0 50
—— Electric Lamps and Electric Lighting. | 8vo, | *3 00
—— Electrical Laboratory Notes and Forms. | 4to, | *5 00
—— A Handbook for the Electrical Laboratory and Testing Room. Two Volumes. | 8vo, each, | *5 00
Fluery, H. The Calculus Without Limits or Infinitesimals. Trans. by C. O. Mailloux. | (In Press.) |
Foley, N. British and American Customary and Metric Measures. | folio, | *3 00
Foster, H. A. Electrical Engineers’ Pocket-book. | (Sixth Edition.) 12mo, leather, | 5 00
Foster, Gen. J. G. Submarine Blasting in Boston (Mass.) Harbor. | 4to, | 3 50
Fowle, F. F. Overhead Transmission Line Crossings. | 12mo, | *1 50
—— The Solution of Alternating Current Problems. | 8vo (In Press.) |
Fox, W., and Thomas, C. W. Practical Course in Mechanical Drawing. | 12mo, | 1 25
Francis, J. B. Lowell Hydraulic Experiments. | 4to, | 15 00
Fuller, G. W. Investigations into the Purification of the Ohio River. | 4to, | *10 00
Furnell, J. Paints, Colors, Oils, and Varnishes. | 8vo, | *1 00
Gant, L. W. Elements of Electric Traction. | 8vo, | *2 50
Garcke, E., and Fells, J. M. Factory Accounts. | 8vo, | 3 00
Garforth, W. E. Rules for Recovering Coal Mines after Explosions and Fires. | 12mo, leather, | 1 50
Geerligs, H. C. P. Cane Sugar and Its Manufacture. | 8vo, | *5 00
Geikie, J. Structural and Field Geology. | 8vo, | *4 00
Gerber, N. Analysis of Milk, Condensed Milk, and Infants’ Milk-Food. | 8vo, | 1 25
Gerhard, W. P. Sanitation, Watersupply and Sewage Disposal of Country Houses. | 12mo, | *2 00
Gerhardi, C. W. H. Electricity Meters. | 8vo, | *4 00
Geschwind, L. Manufacture of Alum and Sulphates. Trans. by C. Salter. | 8vo, | *5 00
Gibbs, W. E. Lighting by Acetylene. | 12mo, | *1 50
—— Physics of Solids and Fluids. (Carnegie Technical School’s Text-books.). |  | *1 50
Gibson, A. H. Hydraulics and Its Application. | 8vo, | *5 00
—— Water Hammer in Hydraulic Pipe Lines. | 12mo, | *2 00
Gillmore, Gen. Q. A. Limes, Hydraulic Cements and Mortars. | 8vo, | 4 00
—— Roads, Streets, and Pavements. | 12mo, | 2 00
Golding, H. A. The Theta-Phi Diagram. | 12mo, | *1 25
Goldschmidt, R. Alternating Current Commutator Motor. | 8vo, | *3 00
Goodchild, W. Precious Stones. (Westminster Series.). | 8vo, | *2 00
Goodeve, T. M. Textbook on the Steam-engine. | 12mo, | 2 00
Gore, G. Electrolytic Separation of Metals. | 8vo, | *3 50
Gould, E. S. Arithmetic of the Steam-engine. | 12mo, | 1 00
—— Practical Hydrostatics and Hydrostatic Formulas. (Science Series.). | 16mo, | 0 50
Grant, J. Brewing and Distilling. (Westminster Series.). | 8vo (In Press.) |
Gray, J. Electrical Influence Machines. | 12mo, | 2 00
Greenwood, E. Classified Guide to Technical and Commercial Books. | 8vo, | *3 00
Gregorius, R. Mineral Waxes. Trans. by C. Salter. | 12mo, | *3 00
Griffiths, A. B. A Treatise on Manures. | 12mo, | 3 00
—— Dental Metallurgy. | 8vo, | *3 50
Gross, E. Hops. | 8vo, | *4 50
Grossman, J. Ammonia and Its Compounds. | 12mo, | *1 25
Groth, L. A. Welding and Cutting Metals by Gases or Electricity. | 8vo, | *3 00
Grover, F. Modern Gas and Oil Engines. | 8vo, | *2 00
Gruner, A. Power-loom Weaving. | 8vo, | *3 00
Güldner, Hugo. Internal Combustion Engines. Trans. by H. Diederichs. | 4to, | *10 00
Gunther, C. O. Integration. | 12mo, | *1 25
Gurden, R. L. Traverse Tables. | folio, half morocco, | 7 50
Guy, A. E. Experiments on the Flexure of Beams. | 8vo, | *1 25
Haeder, H. Handbook on the Steam-engine. Trans. by H. H. P. Powles. | 12mo, | 3 00
Hainbach, R. Pottery Decoration. Trans. by C. Slater. | 12mo, | *3 00
Hale, W. J. Calculations of General Chemistry. | 12mo, | *1 00
Hall, C. H. Chemistry of Paints and Paint Vehicles. | 12mo, | *2 00
Hall, R. H. Governors and Governing Mechanism. | 12mo, | *2 00
Hall, W. S. Elements of the Differential and Integral Calculus. | 8vo, | *2 25
—— Descriptive Geometry. | 8vo volume and a 4to atlas, | *3 50
Haller, G. F., and Cunningham, E. T. The Tesla Coil. | (In Press.) |
Halsey, F. A. Slide Valve Gears. | 12mo, | 1 50
—— The Use of the Slide Rule. (Science Series.). | 16mo, | 0 50
—— Worm and Spiral Gearing. (Science Series.). | 16mo, | 0 50
Hamilton, W. G. Useful Information for Railway Men. | 16mo, | 1 00
Hammer, W. J. Radium and Other Radio-active Substances. | 8vo, | *1 00
Hancock, H. Textbook of Mechanics and Hydrostatics. | 8vo, | 1 50
Hardy, E. Elementary Principles of Graphic Statics. | 12mo, | *1 50
Harper, W. B. Utilization of Wood Waste by Distillation. | 4to, | *3 00
Harrison, W. B. The Mechanics’ Tool-book. | 12mo, | 1 50
Hart, J. W. External Plumbing Work. | 8vo, | *3 00
—— Hints to Plumbers on Joint Wiping. | 8vo, | *3 00
—— Principles of Hot Water Supply. | 8vo, | *3 00
—— Sanitary Plumbing and Drainage. | 8vo, | *3 00
Haskins, C. H. The Galvanometer and Its Uses. | 16mo, | 1 50
Hatt, J. A. H. The Colorist. | square 12mo, | *1 50
Hausbrand, E. Drying by Means of Air and Steam. Trans. by A. C. Wright. | 12mo, | *2 00
—— Evaporating, Condensing and Cooling Apparatus. Trans. by A. C. Wright. | 8vo, | *5 00
Hausner, A. Manufacture of Preserved Foods and Sweetmeats. Trans. by A. Morris and H. Robson. | 8vo, | *3 00
Hawke, W. H. Premier Cipher Telegraphic Code. | 4to, | *5 00
—— 100,000 Words Supplement to the Premier Code. | 4to, | *5 00
Hawkesworth, J. Graphical Handbook for Reinforced Concrete Design. | 4to, | *2 50
Hay, A. Alternating Currents. | 8vo, | *2 50
—— Principles of Alternate-current Working. | 12mo, | 2 00
—— Electrical Distributing Networks and Distributing Lines. | 8vo, | *3 50
—— Continuous Current Engineering. | 8vo, | *2 50
Heap, Major D. P. Electrical Appliances. | 8vo, | 2 00
Heaviside, O. Electromagnetic Theory. Two Volumes. | 8vo, each, | *5 00
Heck, R. C. H. Steam-Engine and Other Steam Motors. Two Volumes. |  |
Vol. I. Thermodynamics and the Mechanics. | 8vo, | *3 50
Vol. II. Form, Construction, and Working. | 8vo, | *5 00
—— Abridged edition of above volumes (Elementary). | 8vo (In Preparation.) |
—— Notes on Elementary Kinematics. | 8vo, boards, | *1 00
—— Graphics of Machine Forces. | 8vo, boards, | *1 00
Hedges, K. Modern Lightning Conductors. | 8vo, | 3 00
Heermann, P. Dyers’ Materials. Trans. by A. C. Wright. | 12mo, | *2 50
Hellot, Macquer and D’Apligny. Art of Dyeing Wool, Silk and Cotton. | 8vo, | *2 00
Henrici, O. Skeleton Structures. | 8vo, | 1 50
Hermann, F. Painting on Glass and Porcelain. | 8vo, | *3 50
Herrmann, G. The Graphical Statics of Mechanism. Trans. by A. P. Smith. | 12mo, | 2 00
Herzfeld, J. Testing of Yarns and Textile Fabrics. | 8vo, | *3 50
Hildebrandt, A. Airships, Past and Present. | 8vo, | *3 50
Hill, J. W. The Purification of Public Water Supplies. New Edition. | (In Press.) |
—— Interpretation of Water Analysis. | (In Press.) |
Hiroi, I. Statically-Indeterminate Stresses. | 12mo, | *2 00
Hirshfeld, C. F. Engineering Thermodynamics. (Science Series.). | 16mo, | 0 50
Hobart, H. M. Heavy Electrical Engineering. | 8vo, | *4 50
—— Electricity. | 8vo, | *2 00
—— Electric Trains. | (In Press.) |
Hobbs, W. R. P. The Arithmetic of Electrical Measurements. | 12mo, | 0 50
Hoff, J. N. Paint and Varnish Facts and Formulas. | 12mo, | *3 00
Hoff, Com. W. B. The Avoidance of Collisions at Sea. | 16mo, morocco, | 0 75
Hole, W. The Distribution of Gas. | 8vo, | *7 50
Holley, A. L. Railway Practice. | folio, | 12 00
Holmes, A. B. The Electric Light Popularly Explained. | 12mo, paper, | 0 50
Hopkins, N. M. Experimental Electrochemistry. | 8vo, | *3 00
—— Model Engines and Small Boats. | 12mo, | 1 25
Horner, J. Engineers’ Turning. | 8vo, | *3 50
—— Metal Turning. | 12mo, | 1 50
—— Toothed Gearing. | 12mo, | 2 25
Houghton, C. E. The Elements of Mechanics of Materials. | 12mo, | *2 00
Houllevique, L. The Evolution of the Sciences. | 8vo, | *2 00
Howe, G. Mathematics for the Practical Man. | 12mo (In Press.) |
Howorth, J. Repairing and Riveting Glass, China and Earthenware. | 8vo, paper, | *0 50
Hubbard, E. The Utilization of Wood-waste. | 8vo, | *2 50
Humber, W. Calculation of Strains in Girders. | 12mo, | 2 50
Humphreys, A. C. The Business Features of Engineering Practice. | 8vo, | *1 25
Hurst, G. H. Handbook of the Theory of Color. | 8vo, | *2 50
—— Dictionary of Chemicals and Raw Products. | 8vo, | *3 00
—— Lubricating Oils, Fats and Greases. | 8vo, | *3 00
—— Soaps. | 8vo, | *5 00
—— Textile Soaps and Oils. | 8vo, | *2 50
Hutchinson R. W., Jr. Long Distance Electric Power Transmission. | 12mo, | *3 00
Hutchinson, R. W., Jr., and Ihlseng, M. C. Electricity in Mining. | 12mo, (In Press.) |
Hutchinson, W. B. Patents and How to Make Money Out of Them. | 12mo, | 1 25
Hutton, W. S. Steam-boiler Construction. | 8vo, | 6 00
—— Practical Engineer’s Handbook. | 8vo, | 7 00
—— The Works’ Manager’s Handbook. | 8vo, | 6 00
Ingle, H. Manual of Agricultural Chemistry. | 8vo, | *3 00
Innes, C, H. Problems in Machine Design. | 12mo, | *2 00
Innes, C. H. Air Compressors and Blowing Engines. | 12mo, | *2 00
—— Centrifugal Pumps. | 12mo, | *2 00
—— The Fan. | 12mo, | *2 00
Isherwood, B. F. Engineering Precedents for Steam Machinery. | 8vo, | 2 50
Jamieson, A. Text Book on Steam and Steam Engines. | 8vo, | 3 00
—— Elementary Manual on Steam and the Steam Engine. | 12mo, | 1 50
Jannettaz, E. Guide to the Determination of Rocks. Trans. by G. W. Plympton. | 12mo, | 1 50
Jehl, F. Manufacture of Carbons. | 8vo, | *4 00
Jennings, A. S. Commercial Paints and Painting. (Westminster Series.). | 8vo (In Press.) |
Jennison, F. H. The Manufacture of Lake Pigments. | 8vo, | *3 00
Jepson, G. Cams and the Principles of their Construction. | 8vo, | *1 50
—— Mechanical Drawing. | 8vo (In Preparation.) |
Jockin, W. Arithmetic of the Gold and Silversmith. | 12mo, | *1 00
Johnson, G. L. Photographic Optics and Color Photography. | 8vo, | *3 00
Johnson, W. H. The Cultivation and Preparation of Para Rubber. | 8vo, | *3 00
Johnson, W. McA. The Metallurgy of Nickel. | (In Preparation.) |
Johnston, J. F. W., and Cameron, C. Elements of Agricultural Chemistry and Geology. | 12mo, | 2 60
Joly, J. Radioactivity and Geology. | 12mo, | *3 00
Jones, H. C. Electrical Nature of Matter and Radioactivity. | 12mo, | 2 00
Jones, M. W. Testing Raw Materials Used in Paint. | 12mo, | *2 00
Jones, L., and Scard, F. I. Manufacture of Cane Sugar. | 8vo, | *5 00
Joynson, F. H. Designing and Construction of Machine Gearing. | 8vo, | 2 00
Jüptner, H. F. V. Siderology: The Science of Iron. | 8vo, | *5 00
Kansas City Bridge. | 4to, | 6 00
Kapp, G. Electric Transmission of Energy. | 12mo, | 3 50
—— Dynamos, Motors, Alternators and Rotary Converters. Trans. by H. H. Simmons. | 8vo, | 4 00
Keim, A. W. Prevention of Dampness in Buildings. | 8vo, | *2 00
Keller, S. S. Mathematics for Engineering Students. | 12mo, half leather. |
Algebra and Trigonometry, with a Chapter on Vectors. |  | *1 75
Special Algebra Edition. |  | *1 00
Plane and Solid Geometry. |  | *1 25
Analytical Geometry and Calculus. |  | *2 00
Kelsey, W. R. Continuous-current Dynamos and Motors. | 8vo, | *2 50
Kemble, W. T., and Underhill, C. R. The Periodic Law and the Hydrogen Spectrum. | 8vo, paper, | *0 50
Kemp, J. F. Handbook of Rocks. | 8vo, | *1 50
Kendall, E. Twelve Figure Cipher Code. | 4to, | *15 00
Kennedy, R. Modern Engines and Power Generators. Six Volumes. | 4to, | 15 00
Single Volumes. | each, | 3 00
—— Electrical Installations. Five Volumes. | 4to, | 15 00
Single Volumes. | each, | 3 50
—— Flying Machines. Practice and Design. | 12mo, | *2 00
Kennelly, A. E. Electro-dynamic Machinery. | 8vo, | 1 50
Kershaw, J. B. C. Fuel, Water and Gas Analysis. | 8vo, | *2 50
—— Electrometallurgy. (Westminster Series.). | 8vo, | *2 00
Kershaw, J. B. C. The Electric Furnace in Iron and Steel Production. | 12mo, | *1 50
Kingdon, J. A. Applied Magnetism. | 8vo, | *3 00
Kinzbrunner, C. Alternate Current Windings. | 8vo, | *1 50
—— Continuous Current Armatures. | 8vo, | *1 50
—— Testing of Alternating Current Machines. | 8vo, | *2 00
Kirkaldy, W. G. David Kirkaldy’s System of Mechanical Testing. | 4to, | 10 00
Kirkbride, J. Engraving for Illustration. | 8vo, | *1 50
Kirkwood, J. P. Filtration of River Waters. | 4to, | 7 50
Klein, J. F. Design of a High-speed Steam-engine. | 8vo, | *5 00
Kleinhans, F. B. Boiler Construction. | 8vo, | 3 00
Knight, Lieut.-Com. A. M. Modern Seamanship. | 8vo, | *6 00
Half morocco. |  | *7 50
Knox, W. F. Logarithm Tables. | (In Preparation.) |
Knott, C. G., and Mackay, J. S. Practical Mathematics. | 8vo, | 2 00
Koester, F. Steam-Electric Power Plants. | 4to, | *5 00
—— Hydroelectric Developments and Engineering. | 4to, | *5 00
Koller, T. The Utilization of Waste Products. | 8vo, | *3 50
—— Cosmetics. | 8vo, | *2 50
Krauch, C. Testing of Chemical Reagents. Trans. by J. A. Williamson and L. W. Dupre. | 8vo, | *3 00
Lambert, T. Lead and its Compounds. | 8vo, | *3 50
—— Bone Products and Manures. | 8vo, | *3 00
Lamborn, L. L. Cottonseed Products. | 8vo, | *3 00
—— Modern Soaps, Candles, and Glycerin. | 8vo, | *7 50
Lamprecht, R. Recovery Work After Pit Fires. Trans. by C. Salter. | 8vo, | *4 00
Lanchester, F. W. Aerial Flight. Two Volumes. 8vo. |  |
Vol. I. Aerodynamics. |  | *6 00
Vol. II. Aerodonetics. |  | *6 00
Larner, E. T. Principles of Alternating Currents. | 12mo, | *1 25
Larrabee, C. S. Cipher and Secret Letter and Telegraphic Code. | 16mo, | 0 60
Lassar-Cohn, Dr. Modern Scientific Chemistry. Trans. by M. M. Pattison Muir. | 12mo, | *2 00
Latta, M. N. Handbook of American Gas-Engineering Practice. | 8vo, | *4 50
—— American Producer Gas Practice. | 4to, | *6 00
Leask, A. R. Breakdowns at Sea. | 12mo, | 2 00
—— Triple and Quadruple Expansion Engines. | 12mo, | 2 00
—— Refrigerating Machinery. | 12mo, | 2 00
Lecky, S. T. S. “Wrinkles” in Practical Navigation. | 8vo, | *8 00
Leeds, C. C. Mechanical Drawing for Trade Schools. | oblong 4to, |
High School Edition. |  | *1 25
Machinery Trades Edition. |  | *2 00
Lefévre, L. Architectural Pottery. Trans. by H. K. Bird and W. M. Binns. | 4to, | *7 50
Lehner, S. Ink Manufacture. Trans. by A. Morris and H. Robson. | 8vo, | *2 50
Lemstrom, S. Electricity in Agriculture and Horticulture. | 8vo, | *1 50
Lewes, V. B. Liquid and Gaseous Fuels. (Westminster Series.). | 8vo, | *2 00
Lieber, B. F. Lieber’s Standard Telegraphic Code. | 8vo, | *10 00
—— Code. German Edition. | 8vo, | *10 00
—— —— Spanish Edition. | 8vo, | *10 00
Lieber, B. F. Code. French Edition. | 8vo, | *10 00
—— Terminal Index. | 8vo, | *2 50
—— Lieber’s Appendix. | folio, | *15 00
—— —— Handy Tables. | 4to, | *2 50
—— Bankers and Stockbrokers’ Code and Merchants and Shippers’ Blank Tables. | 8vo, | *15 00
—— 100,000,000 Combination Code. | 8vo, | *15 00
—— Engineering Code. | 8vo, | *10 00
Livermore, V. P., and Williams, J. How to Become a Competent Motorman. | 12mo, | *1 00
Livingstone, R. Design and Construction of Commutators. | 8vo, | *2 25
Lobben, P. Machinists’ and Draftsmen’s Handbook. | 8vo, | 2 50
Locke, A. G. and C. G. Manufacture of Sulphuric Acid. | 8vo, | 10 00
Lockwood, T. D. Electricity, Magnetism, and Electro-telegraphy. | 8vo, | 2 50
—— Electrical Measurement and the Galvanometer. | 12mo, | 1 50
Lodge, O. J. Elementary Mechanics. | 12mo, | 1 50
—— Signalling Across Space without Wires. | 8vo, | *2 00
Lord, R. T. Decorative and Fancy Fabrics. | 8vo, | *3 50
Loring, A. E. A Handbook of the Electromagnetic Telegraph. | 16mo, | 0 50
Lowenstein, L. C., and Crissey, C. P. Centrifugal Pumps. | (In Press.) |
Lucke, C. E. Gas Engine Design. | 8vo, | *3 00
—— Power Plants: their Design, Efficiency, and Power Costs. 2 vols. | (In Preparation.) |
—— Power Plant Papers. Form I. The Steam Power Plant. | paper, | *1 50
Lunge, G. Coal-tar and Ammonia. Two Volumes. | 8vo, | *15 00
—— Manufacture of Sulphuric Acid and Alkali. Three Volumes. | 8vo, |
Vol. I. Sulphuric Acid. In two parts. |  | *15 00
Vol. II. Salt Cake, Hydrochloric Acid and Leblanc Soda. In two parts. |  | *15 00
Vol. III. Ammonia Soda. |  | *15 00
—— Technical Chemists’ Handbook. | 12mo, leather, | *3 50
—— Technical Methods of Chemical Analysis. Trans. by C. A. Keane. in collaboration with the corps of specialists. |  |
Vol. I. In two parts. | 8vo, | *15 00
Vols. II and III. | (In Preparation.) |
Lupton, A., Parr, G. D. A., and Perkin, H. Electricity as Applied to Mining. | 8vo, | *4 50
Luquer, L. M. Minerals in Rock Sections. | 8vo, | *1 50
Macewen, H. A. Food Inspection. | 8vo, | *2 50
Mackie, J. How to Make a Woolen Mill Pay. | 8vo, | *2 00
Mackrow, C. Naval Architect’s and Shipbuilder’s Pocket-book. | 16mo, leather, | 5 00
Maguire, Capt. E. The Attack and Defense of Coast Fortifications. | 8vo, | 2 50
Maguire, Wm. R. Domestic Sanitary Drainage and Plumbing. | 8vo, | 4 00
Marks, E. C. R. Construction of Cranes and Lifting Machinery. | 12mo, | *1 50
—— Construction and Working of Pumps. | 12mo, | *1 50
—— Manufacture of Iron and Steel Tubes. | 12mo, | *2 00
—— Mechanical Engineering Materials. | 12mo, | *1 00
Marks, G. C. Hydraulic Power Engineering. | 8vo, | 3 50
—— Inventions, Patents and Designs. | 12mo, | *1 00
Markham, E. R. The American Steel Worker. | 12mo, | 2 50
Marlow, T. G. Drying Machinery and Practice. | 8vo, |
Marsh, C. F. Concise Treatise on Reinforced Concrete. | 8vo, | *2 50
Marsh, C. F., and Dunn, W. Reinforced Concrete. | 4to, | *5 00
—— Manual of Reinforced Concrete and Concrete Block Construction. | 16mo, morocco, | *2 50
Massie, W. W., and Underhill, C. R. Wireless Telegraphy and Telephony. | 12mo, | *1 00
Matheson, D. Australian Saw-Miller’s Log and Timber Ready Reckoner. | 12mo, leather, | 1 50
Mathot, R. E. Internal Combustion Engines. | 8vo, |
Maurice, W. Electric Blasting Apparatus and Explosives. | 8vo, | *3 50
—— Shot Firer’s Guide. | 8vo, | *1 50
Maxwell, W. H., and Brown, J. T. Encyclopedia of Municipal and Sanitary Engineering. | 4to, | *10 00
Mayer, A. M. Lecture Notes on Physics. | 8vo, | 2 00
McCullough, R. S. Mechanical Theory of Heat. | 8vo, | 3 50
McIntosh, J. G. Technology of Sugar. | 8vo, | *4 50
—— Industrial Alcohol. | 8vo, | *3 00
—— Manufacture of Varnishes and Kindred Industries. Three Volumes. 8vo. |  |
Vol. I. Oil Crushing, Refining and Boiling. |  | *3 50
Vol. II. Varnish Materials and Oil Varnish Making. |  | *4 00
Vol. III. | (In Preparation.) |
McMechen, F. L. Tests for Ores, Minerals and Metals. | 12mo, | *1 00
McNeill, B. McNeill’s Code. | 8vo, | *6 00
McPherson, J. A. Water-works Distribution. | 8vo, | 2 50
Melick, C. W. Dairy Laboratory Guide. | 12mo, | *1 25
Merck, E. Chemical Reagents. Their Purity and Tests. | 8vo, | *1 50
Merritt, Wm. H. Field Testing for Gold and Silver. | 16mo, leather, | 1 50
Meyer, J. G. A., and Pecker, C. G. Mechanical Drawing and Machine Design. | 4to, | 5 00
Michell, S. Mine Drainage. | 8vo, | 10 00
Mierzinski, S. Waterproofing of Fabrics. Trans. by A. Morris and H. Robson. | 8vo, | *2 50
Miller, E. H. Quantitative Analysis for Mining Engineers. | 8vo, | *1 50
Milroy, M. E. W. Home Lace-making. | 12mo, | *1 00
Minifie, W. Mechanical Drawing. | 8vo, | *4 00
Modern Meteorology. | 12mo, | 1 50
Monckton, C. C. F. Radiotelegraphy. (Westminster Series.). | 8vo, | *2 00
Monteverde, R. D. Vest Pocket Glossary of English-Spanish, Spanish-English Technical Terms. | 64mo, leather, | *1 00
Moore, E. C. S. New Tables for the Complete Solution of Ganguillet and Kutter’s Formula. | 8vo, | *5 00
Moreing, C. A., and Neal, T. New General and Mining Telegraph Code. | 8vo, | *5 00
Morgan, A. P. Wireless Telegraph Apparatus for Amateurs. | 12mo, | *1 50
Moses, A. J. The Characters of Crystals. | 8vo, | *2 00
Moses, A. J., and Parsons, C. L. Elements of Mineralogy. | 8vo, | *2 50
Moss, S. A. Elements of Gas Engine Design. (Science Series.). | 16mo, | 0 50
—— The Lay-out of Corliss Valve Gears. (Science Series.). | 16mo, | 0 50
Mullin, J. P. Modern Moulding and Pattern-making. | 12mo, | 2 50
Munby, A. E. Chemistry and Physics of Building Materials. (Westminster Series.). | 8vo, | *2 00
Murphy, J. G. Practical Mining. | 16mo, | 1 00
Murray, J. A. Soils and Manures. (Westminster Series.). | 8vo, | *2 00
Naquet, A. Legal Chemistry. | 12mo, | 2 00
Nasmith, J. The Student’s Cotton Spinning. | 8vo, | 3 00
Nerz, F. Searchlights. Trans. by C. Rodgers. | 8vo, | *3 00
Neuberger, H., and Noalhat, H. Technology of Petroleum. Trans. by J. G. McIntosh. | 8vo, | *10 00
Newall, J. W. Drawing, Sizing and Cutting Bevel-gears. | 8vo, | 1 50
Newlands, J. Carpenters and Joiners’ Assistant. | folio, half morocco, | 15 00
Nicol, G. Ship Construction and Calculations. | 8vo, | *4 50
Nipher, F. E. Theory of Magnetic Measurements. | 12mo, | 1 00
Nisbet, H. Grammar of Textile Design. | 8vo, | *3 00
Noll, A. How to Wire Buildings. | 12mo, | 1 50
Nugent, E. Treatise on Optics. | 12mo, | 1 50
O’Connor, H. The Gas Engineer’s Pocketbook. | 12mo, leather, | 3 50
—— Petrol Air-Gas. | 12mo, | *0 75
Olsson, A. Motor Control, in Turret Turning and Gun Elevating. (U. S. Navy Electrical Series, No. 1.). | 12mo, paper, | *0 50
Olsen, J. C. Text-book of Quantitative Chemical Analysis. | 8vo, | *4 00
Oudin, M. A. Standard Polyphase Apparatus and Systems. | 8vo, | *3 00
Palaz, A. Industrial Photometry. Trans. by G. W. Patterson, Jr. | 8vo, | *4 00
Pamely, C. Colliery Manager’s Handbook. | 8vo, | *10 00
Parr, G. D. A. Electrical Engineering Measuring Instruments. | 8vo, | *3 50
Parry, E. J. Chemistry of Essential Oils and Artificial Perfumes. | 8vo, | *5 00
Parry, E. J., and Coste, J. H. Chemistry of Pigments. | 8vo, | *4 50
Parry, L. A. Risk and Dangers of Various Occupations. | 8vo, | *3 00
Parshall, H. F., and Hobart, H. M. Armature Windings. | 4to, | *7 50
—— Electric Railway Engineering. | 4to, | *10 00
Parshall, H. F., and Parry, E. Electrical Equipment of Tramways. | (In Press.) |
Parsons, S. J. Malleable Cast Iron. | 8vo, | *2 50
Passmore, A. C. Technical Terms Used in Architecture. | 8vo, | *3 50
Patterson, D. The Color Printing of Carpet Yarns. | 8vo, | *3 50
—— Color Matching on Textiles. | 8vo, | *3 00
—— The Science of Color Mixing. | 8vo, | *3 00
Patton, H. B. Lecture Notes on Crystallography. | 8vo, | *1 25
Paulding, C. P. Condensation of Steam in Covered and Bare Pipes. | 8vo, | *2 00
—— Transmission of Heat through Cold-storage Insulation. | 12mo, | *1 00
Peirce, B. System of Analytic Mechanics. | 4to, | 10 00
Pendred, V. The Railway Locomotive. (Westminster Series.). | 8vo, | *2 00
Perkin, F. M. Practical Methods of Inorganic Chemistry. | 12mo, | *1 00
Perrigo, O. E. Change Gear Devices. | 8vo, | 1 00
Perrine, F. A. C. Conductors for Electrical Distribution. | 8vo, | *3 50
Petit, G. White Lead and Zinc White Paints. | 8vo, | *1 50
Petit, R. How to Build an Aeroplane. Trans. by T. O’B. Hubbard, and J. H. Ledeboer. | 8vo, | *1 50
Perry, J. Applied Mechanics. | 8vo, | *2 50
Phillips, J. Engineering Chemistry. | 8vo, | *4 50
—— Gold Assaying. | 8vo, | *2 50
Phin, J. Seven Follies of Science. | 12mo, | *1 25
—— Household Pests, and How to Get Rid of Them. | 8vo (In Preparation.) |
Pickworth, C. N. The Indicator Handbook. Two Volumes. | 12mo, each, | 1 50
—— Logarithms for Beginners. | 12mo, boards, | 0 50
—— The Slide Rule. | 12mo, | 1 00
Plane Table, The. | 8vo, | 2 00
Plattner’s Manual of Blow-pipe Analysis. Eighth Edition, revised. Trans. by H. B. Cornwall. | 8vo, | *4 00
Plympton, G. W. The Aneroid Barometer. (Science Series.). | 16mo, | 0 50
Pocket Logarithms to Four Places. (Science Series.). | 16mo, | 0 50
Pope, F. L. Modern Practice of the Electric Telegraph. | 8vo, | 1 50
Popplewell, W. C. Elementary Treatise on Heat and Heat Engines. | 12mo, | *3 00
—— Prevention of Smoke. | 8vo, | *3 50
—— Strength of Materials. | 8vo, | *1 75
Potter, T. Concrete. | 8vo, | *3 00
Practical Compounding of Oils, Tallow and Grease. | 8vo, | *3 50
Practical Iron Founding. | 12mo, | 1 50
Pray, T., Jr. Twenty Years with the Indicator. | 8vo, | 2 50
—— Steam Tables and Engine Constant. | 8vo, | 2 00
—— Calorimeter Tables. | 8vo, | 1 00
Preece, W. H. Electric Lamps. | (In Press.) |
Prelini, C. Earth and Rock Excavation. | 8vo, | *3 00
—— Graphical Determination of Earth Slopes. | 8vo, | *2 00
—— Tunneling. | 8vo, | 3 00
—— Dredging. A Practical Treatise. | (In Press.) |
Prescott, A. B. Organic Analysis. | 8vo, | 5 00
Prescott, A. B., and Johnson, O. C. Qualitative Chemical Analysis. | 8vo, | *3 50
Prescott, A. B., and Sullivan, E. C. First Book in Qualitative Chemistry. | 12mo, | *1 50
Pritchard, O. G. The Manufacture of Electric-light Carbons. | 8vo, paper, | *0 60
Prost, E. Chemical Analysis of Fuels, Ores, Metals. Trans. by J. C. Smith. | 8vo, | *4 50
Pullen, W. W. F. Application of Graphic Methods to the Design of Structures. | 12mo, | *2 50
—— Injectors: Theory, Construction and Working. | 12mo, | *1 50
Pulsifer, W. H. Notes for a History of Lead. | 8vo, | 4 00
Putsch, A. Gas and Coal-dust Firing. | 8vo, | *3 00
Pynchon, T. R. Introduction to Chemical Physics. | 8vo, | 3 00
Rafter, G. W. Treatment of Septic Sewage. (Science Series.). | 16mo, | 0 50
Rafter, G. W., and Baker, M. N. Sewage Disposal in the United States. | 4to, | *6 00
Raikes, H. P. Sewage Disposal Works. | 8vo, | *4 00
Railway Shop Up-to-Date. | 4to, | 2 00
Ramp, H. M. Foundry Practice. | (In Press.) |
Randall, P. M. Quartz Operator’s Handbook. | 12mo, | 2 00
Randau, P. Enamels and Enamelling. | 8vo, | *4 00
Rankine, W. J. M. Applied Mechanics. | 8vo, | 5 00
—— Civil Engineering. | 8vo, | 6 50
—— Machinery and Millwork. | 8vo, | 5 00
Rankine, W. J. M. The Steam-engine and Other Prime Movers. | 8vo, | 5 00
—— Useful Rules and Tables. | 8vo, | 4 00
Rankine, W. J. M., and Bamber, E. F. A Mechanical Text-book. | 8vo, | 3 50
Raphael, F. C. Localization of Faults in Electric Light and Power Mains. | 8vo, | *3 00
Rathbone, R. L. B. Simple Jewellery. | 8vo, | *2 00
Rateau, A. Flow of Steam through Nozzles and Orifices. Trans. by H. B. Brydon. | 8vo, | *1 50
Rausenberger, F. The Theory of the Recoil of Guns. | 8vo, | *4 50
Rautenstrauch, W. Notes on the Elements of Machine Design. | 8vo, boards, | *1 50
Rautenstrauch, W., and Williams, J. T. Machine Drafting and Empirical Design. |  |
Part I. Machine Drafting. | 8vo, | *1 25
Part II. Empirical Design. | (In Preparation.) |
Raymond, E. B. Alternating Current Engineering. | 12mo, | *2 50
Rayner, H. Silk Throwing and Waste Silk Spinning. | 8vo, | *2 50
Recipes for the Color, Paint, Varnish, Oil, Soap and Drysaltery Trades. | 8vo, | *3 50
Recipes for Flint Glass Making. | 12mo, | *4 50
Reed’s Engineers’ Handbook. | 8vo, | *5 00
—— Key to the Nineteenth Edition of Reed’s Engineers’ Handbook. | 8vo, | *3 00
—— Useful Hints to Sea-going Engineers. | 12mo, | 1 50
—— Marine Boilers. | 12mo, | 2 00
Reinhardt, C. W. Lettering for Draftsmen, Engineers, and Students. | oblong 4to, boards, | 1 00
—— The Technic of Mechanical Drafting. | oblong 4to, boards, | *1 00
Reiser, F. Hardening and Tempering of Steel. Trans. by A. Morris and H. Robson. | 12mo, | *2 50
Reiser, N. Faults in the Manufacture of Woolen Goods. Trans. by A. Morris and H. Robson. | 8vo, | *2 50
—— Spinning and Weaving Calculations. | 8vo, | *5 00
Renwick, W. G. Marble and Marble Working. | 8vo, | 5 00
Rhead, G. F. Simple Structural Woodwork. | 12mo, | *1 00
Rice, J. M., and Johnson, W. W. A New Method of Obtaining the Differential of Functions. | 12mo, | 0 50
Richardson, J. The Modern Steam Engine. | 8vo, | *3 50
Richardson, S. S. Magnetism and Electricity. | 12mo, | *2 00
Rideal, S. Glue and Glue Testing. | 8vo, | *4 00
Rings, F. Concrete in Theory and Practice. | 12mo, | *2 50
Ripper, W. Course of Instruction in Machine Drawing. | folio, | *6 00
Roberts, J., Jr. Laboratory Work in Electrical Engineering. | 8vo, | *2 00
Robertson, L. S. Water-tube Boilers. | 8vo, | 3 00
Robinson, J. B. Architectural Composition. | 8vo, | *2 50
Robinson, S. W. Practical Treatise on the Teeth of Wheels. (Science Series.). | 16mo, | 0 50
Roebling, J. A. Long and Short Span Railway Bridges. | folio, | 25 00
Rogers, A. A Laboratory Guide of Industrial Chemistry. | 12mo, | *1 50
Rogers, A., and Aubert, A. B. Industrial Chemistry. | (In Press.) |
Rollins, W. Notes on X-Light. | 8vo, | *7 50
Rose, J. The Pattern-makers’ Assistant. | 8vo, | 2 50
—— Key to Engines and Engine-running. | 12mo, | 2 50
Rose, T. K. The Precious Metals. (Westminster Series.). | 8vo, | *2 00
Rosenhain, W. Glass Manufacture. (Westminster Series.). | 8vo, | *2 00
Rossiter, J. T. Steam Engines. (Westminster Series.). | 8vo (In Press.) |
—— Pumps and Pumping Machinery. (Westminster Series.). | 8vo (In Press.) |
Roth. Physical Chemistry. | 8vo, | *2 00
Rouillion, L. The Economics of Manual Training. | 8vo, | 2 00
Rowan, F. J. Practical Physics of the Modern Steam-boiler. | 8vo, | 7 50
Roxburgh, W. General Foundry Practice. | 8vo, | *3 50
Ruhmer, E. Wireless Telephony. Trans. by J. Erskine-Murray. | 8vo, | *3 50
Russell, A. Theory of Electric Cables and Networks. | 8vo, | *3 00
Sabine, R. History and Progress of the Electric Telegraph. | 12mo, | 1 25
Saeltzer, A. Treatise on Acoustics. | 12mo, | 1 00
Salomons, D. Electric Light Installations. 12mo. |  |
Vol. I. The Management of Accumulators. |  | 2 50
Vol. II. Apparatus. |  | 2 25
Vol. III. Applications. |  | 1 50
Sanford, P. G. Nitro-explosives. | 8vo, | *4 00
Saunders, C. H. Handbook of Practical Mechanics. | 16mo, | 1 00
| leather, | 1 25
Saunnier, C. Watchmaker’s Handbook. | 12mo, | 3 00
Sayers, H. M. Brakes for Tram Cars. | 8vo, | *1 25
Scheele, C. W. Chemical Essays. | 8vo, | *2 00
Schellen, H. Magneto-electric and Dynamo-electric Machines. | 8vo, | 5 00
Scherer, R. Casein. Trans. by C. Salter. | 8vo, | *3 00
Schmall, C. N. First Course in Analytic Geometry, Plane and Solid. | 12mo, half leather, | *1 75
Schmall, C. N., and Shack, S. M. Elements of Plane Geometry. | 12mo, | *1 25
Schmeer, L. Flow of Water. | 8vo, | *3 00
Schumann, F. A Manual of Heating and Ventilation. | 12mo, leather, | 1 50
Schwarz, E. H. L. Causal Geology. | 8vo, | *2 50
Schweizer, V., Distillation of Resins. | 8vo, | *3 50
Scott, W. W. Qualitative Analysis. A Laboratory Manual. | 8vo (In Press.) |
Scribner, J. M. Engineers’ and Mechanics’ Companion. | 16mo, leather, | 1 50
Searle, G. M. “Sumners’ Method." Condensed and Improved. (Science Series.). | 16mo, | 0 50
Seaton, A. E. Manual of Marine Engineering. | 8vo, | 6 00
Seaton, A. E., and Rounthwaite, H. M. Pocket-book of Marine Engineering. | 16mo, leather, | 3 00
Seeligmann, T., Torrilhon, G. L., and Falconnet, H. India Rubber and Gutta Percha. Trans. by J. G. McIntosh. | 8vo, | *5 00
Seidell, A. Solubilities of Inorganic and Organic Substances. | 8vo, | *3 00
Sellew, W. H. Steel Rails. | 4to (In Press.) |
Senter, G. Outlines of Physical Chemistry. | 12mo, | *1 50
Sever, G. F. Electric Engineering Experiments. | 8vo, boards, | *1 00
Sever, G. F., and Townsend, F. Laboratory and Factory Tests in Electrical Engineering. | 8vo, | *2 50
Sewall, C. H. Wireless Telegraphy. | 8vo, | *2 00
—— Lessons in Telegraphy. | 12mo, | *1 00
Sewell, T. Elements of Electrical Engineering. | 8vo, | *3 00
—— The Construction of Dynamos. | 8vo, | *3 00
Sexton, A. H. Fuel and Refractory Materials. | 12mo, | *2 50
Sexton, A. H. Chemistry of the Materials of Engineering. | 12 mo, | *2 50
—— Alloys (Non-Ferrous). | 8vo, | *3 00
—— The Metallurgy of Iron and Steel. | 8vo, | *6 50
Seymour, A. Practical Lithography. | 8vo, | *2 50
—— Modern Printing Inks. | 8vo, | *2 00
Shaw, P. E. Course of Practical Magnetism and Electricity. | 8vo, | *1 00
Shaw, S. History of the Staffordshire Potteries. | 8vo, | *3 00
—— Chemistry of Compounds Used in Porcelain Manufacture. | 8vo, | *5 00
Sheldon, S., and Hausmann, E. Direct Current Machines. | 8vo, | *2 50
Sheldon, S., Mason, H., and Hausmann, E. Alternating-current Machines. | 8vo, | *2 50
Sherer, R. Casein. Trans. by C. Salter. | 8vo, | *3 00
Sherriff, F. F. Oil Merchants’ Manual. | 12mo, | *3 50
Shields, J. E. Notes on Engineering Construction. | 12mo, | 1 50
Shock, W. H. Steam Boilers. | 4to, half morocco, | 15 00
Shreve, S. H. Strength of Bridges and Roofs. | 8vo, | 3 50
Shunk, W. F. The Field Engineer. | 12mo, morocco, | 2 50
Simmons, W. H., and Appleton, H. A. Handbook of Soap Manufacture. | 8vo, | *3 00
Simms, F. W. The Principles and Practice of Leveling. | 8vo, | 2 50
—— Practical Tunneling. | 8vo, | 7 50
Simpson, G. The Naval Constructor. | 12mo, morocco, | *5 00
Sinclair, A. Development of the Locomotive Engine. | 8vo, half leather, | 5 00
Sindall, R. W. Manufacture of Paper. (Westminster Series.). | 8vo, | *2 00
Sloane, T. O’C. Elementary Electrical Calculations. | 12mo, | *2 00
Smith, C. F. Practical Alternating Currents and Testing. | 8vo, | *2 50
—— Practical Testing of Dynamos and Motors. | 8vo, | *2 00
Smith, F. E. Handbook of General Instruction for Mechanics. | 12mo, | 1 50
Smith, I. W. The Theory of Deflections and of Latitudes and Departures. | 16mo, morocco, | 3 00
Smith, J. C. Manufacture of Paint. | 8vo, | *3 00
Smith, W. Chemistry of Hat Manufacturing. | 12mo, | *3 00
Snell, A. T. Electric Motive Power. | 8vo, | *4 00
Snow, W. G. Pocketbook of Steam Heating and Ventilation. | (In Press.) |
Snow, W. G., and Nolan, T. Ventilation of Buildings. (Science Series.). | 16mo, | 0 50
Soddy, F. Radioactivity. | 8vo, | *3 00
Solomon, M. Electric Lamps. (Westminster Series.). | 8vo, | *2 00
Sothern, J. W. The Marine Steam Turbine. | 8vo, | *5 00
Soxhlet, D. H. Dyeing and Staining Marble. Trans. by A. Morris and H. Robson. | 8vo, | *2 50
Spang, H. W. A Practical Treatise on Lightning Protection. | 12mo, | 1 00
Speyers, C. L. Text-book of Physical Chemistry. | 8vo, | *2 25
Stahl, A. W., and Woods, A. T. Elementary Mechanism. | 12mo, | *2 00
Staley, C., and Pierson, G. S. The Separate System of Sewerage. | 8vo, | *3 00
Standage, H. C. Leatherworkers’ Manual. | 8vo, | *3 50
—— Sealing Waxes, Wafers, and Other Adhesives. | 8vo, | *2 00
—— Agglutinants of all Kinds for all Purposes. | 12mo, | *3 50
Stansbie, J. H. Iron and Steel. (Westminster Series.). | 8vo, | *2 00
Stevens, H. P. Paper Mill Chemist. | 16mo, | *2 50
Stewart, A. Modern Polyphase Machinery. | 12mo, | *2 00
Stewart, G. Modern Steam Traps. | 12mo, | *1 25
Stiles, A. Tables for Field Engineers. | 12mo, | 1 00
Stillman, P. Steam-engine Indicator. | 12mo, | 1 00
Stodola, A. Steam Turbines. Trans. by L. C. Loewenstein. | 8vo, | *5 00
Stone, H. The Timbers of Commerce. | 8vo, | 3 50
Stone, Gen. R. New Roads and Road Laws. | 12mo, | 1 00
Stopes, M. Ancient Plants. | 8vo, | *2 00
Sudborough, J. J., and James, T. C. Practical Organic Chemistry. | 12mo, | *2 00
Suffling, E. R. Treatise on the Art of Glass Painting. | 8vo, | *3 50
Swan, K. Patents, Designs and Trade Marks. (Westminster Series.). | 8vo, | *2 00
Sweet, S. H. Special Report on Coal. | 8vo, | 3 00
Swoope, C. W. Practical Lessons in Electricity. | 12mo, | *2 00
Tailfer, L. Bleaching Linen and Cotton Yarn and Fabrics. | 8vo, | *5 00
Templeton, W. Practical Mechanic’s Workshop Companion. | 12mo, morocco, | 2 00
Terry, H. L. India Rubber and its Manufacture. (Westminster Series.). | 8vo, | *2 00
Thom, C., and Jones, W. H. Telegraphic Connections. | oblong 12mo, | 1 50
Thomas, C. W. Paper-makers’ Handbook. | (In Press.) |
Thompson, A. B. Oil Fields of Russia. | 4to, | *7 50
—— Petroleum Mining and Oil Field Development. | 8vo, | *5 00
Thompson, E. P. How to Make Inventions. | 8vo, | 0 50
Thompson, W. P. Handbook of Patent Law of All Countries. | 16mo, | 1 50
Thornley, T. Cotton Combing Machines. | 8vo, | *3 00
—— Cotton Spinning. 8vo. |  |
First Year. |  | *1 50
Second Year. |  | *2 50
Third Year. |  | *2 50
Thurso, J. W. Modern Turbine Practice. | 8vo, | *4 00
Tinney, W. H. Gold-mining Machinery. | 8vo, | *5 00
Titherley, A. W. Laboratory Course of Organic Chemistry. | 8vo, | *2 00
Toch, M. Chemistry and Technology of Mixed Paints. | 8vo, | *3 00
Todd, J., and Whall, W. B. Practical Seamanship. | 8vo, | *7 50
Tonge, J. Coal. (Westminster Series.). | 8vo, | *2 00
Townsend, J. Ionization of Gases by Collision. | 8vo, | *1 75
Transactions of the American Institute of Chemical Engineers. | 8vo. |
Vol. I. 1908. |  | *6 00
Vol. II. 1909. |  | *6 00
Traverse Tables. (Science Series.). | 16mo, | 1 50
| morocco, | 1 00
Trinks, W., and Housum, C. Shaft Governors. (Science Series.). | 16mo, | 0 50
Tucker, J. H. A Manual of Sugar Analysis. | 8vo, | 3 50
Tumlirz, O. Potential. Trans. by D. Robertson. | 12mo, | 1 25
Tunner, P. A. Treatise on Roll-turning. Trans. by J. B. Pearse. | 8vo, text and folio atlas, | 10 00
Turbayne, A. A. Alphabets and Numerals. | 4to, | 2 00
Turrill, S. M. Elementary Course in Perspective. | 12mo, | *1 25
Underhill, C. R. Solenoids, Electromagnets and Electromagnetic Windings. | 12mo, | *2 00
Urquhart, J. W. Electric Light Fitting. | 12mo, | 2 00
—— Electro-plating. | 12mo, | 2 00
—— Electrotyping. | 12mo, | 2 00
—— Electric Ship Lighting. | 12mo, | 3 00
Universal Telegraph Cipher Code. | 12mo, | 1 00
Vacher, F. Food Inspector’s Handbook. | 12mo, | *2 50
Van Nostrand’s Chemical Annual. Second issue 1909. | 12mo, | *2 50
—— Year Book of Mechanical Engineering Data. First issue 1910. | (In Press.) |
Van Wagenen, T. F. Manual of Hydraulic Mining. | 16mo, | 1 00
Vega, Baron Von. Logarithmic Tables. | 8vo, half morocco, | 2 50
Villon, A. M. Practical Treatise on the Leather Industry. Trans. by F. T. Addyman. | 8vo, | *10 00
Vincent, C. Ammonia and its Compounds. Trans. by M. J. Salter. | 8vo, | *2 00
Volk, C. Haulage and Winding Appliances. | 8vo, | *4 00
Von Georgievics, G. Chemical Technology of Textile Fibres. Trans. by C. Salter. | 8vo, | *4 50
—— Chemistry of Dyestuffs. Trans. by C. Salter. | 8vo, | *4 50
Wabner, R. Ventilation in Mines. Trans. by C. Salter. | 8vo, | *4 50
Wade, E. J. Secondary Batteries. | 8vo, | *4 00
Wadsworth, C. Primary Battery Ignition. | 12mo (In Press.) |
Wagner, E. Preserving Fruits, Vegetables, and Meat. | 12mo, | *2 50
Walker, F. Aerial Navigation. | 8vo, | 3 00
—— Electric Lighting for Marine Engineers. | 8vo, | 2 00
Walker, S. F. Steam Boilers, Engines and Turbines. | 8vo, | 3 00
—— Refrigeration, Heating and Ventilation on Shipboard. | 12mo (In Press.) |
—— Electricity in Mining. | 8vo, | *3 50
—— Steam Boilers, Engines and Turbines. | 8vo, | *3 00
Walker, W. H. Screw Propulsion. | 8vo, | 0 75
Wallis-Tayler, A. J. Bearings and Lubrication. | 8vo, | *1 50
—— Modern Cycles. | 8vo, | 4 00
—— Motor Cars. | 8vo, | 1 80
—— Motor Vehicles for Business Purposes. | 8vo, | 3 50
—— Pocket Book of Refrigeration and Ice Making. | 12mo, | 1 50
—— Refrigerating and Ice-making Machinery. | 8vo, | 3 00
—— Refrigeration and Cold Storage. | 8vo, | *4 50
—— Sugar Machinery. | 12mo, | *2 00
Wanklyn, J. A. Treatise on the Examination of Milk. | 12mo, | 1 00
—— Water Analysis. | 12mo, | 2 00
Wansbrough, W. D. The A B C of the Differential Calculus. | 12mo, | *1 50
—— Slide Valves. | 12mo, | *2 00
Ward, J. H. Steam for the Million. | 8vo, | 1 00
Waring, G. E., Jr. Sewerage and Land Drainage. |  | *6 00
—— Modern Methods of Sewage Disposal. | 12mo, | 2 00
—— How to Drain a House. | 12mo, | 1 25
Warren, F. D. Handbook on Reinforced Concrete. | 12mo, | *2 50
Watkins, A. Photography. (Westminster Series.). | 8vo (In Press.) |
Watson, E. P. Small Engines and Boilers. | 12mo, | 1 25
Watt, A. Electro-plating and Electro-refining of Metals. | 8vo, | *4 50
Watt, A. Electro-metallurgy. | 12mo, | 1 00
—— The Art of Soap-making. | 8vo, | 3 00
—— Leather Manufacture. | 8vo, | *4 00
Weale, J. Dictionary of Terms Used in Architecture. | 12mo, | 2 50
Weather and Weather Instruments. | 12mo, | 1 00
| paper, | 0 50
Webb, H. L. Guide to the Testing of Insulated Wires and Cables. | 12mo, | 1 00
Webber, W. H. Y. Town Gas. (Westminster Series.). | 8vo, | *2 00
Weekes, R. W. The Design of Alternate Current Transformers. | 12mo, | 1 00
Weisbach, J. A Manual of Theoretical Mechanics. | 8vo, | *6 00
| sheep, | *7 50
Weisbach, J., and Herrmann, G. Mechanics of Air Machinery. | 8vo, | *3 75
Weston, E. B. Loss of Head Due to Friction of Water in Pipes. | 12mo, | *1 50
Weymouth, F. M. Drum Armatures and Commutators. | 8vo, | *3 00
Wheeler, J. B. Art of War. | 12mo, | 1 75
—— Field Fortifications. | 12mo, | 1 75
Whipple, S. An Elementary and Practical Treatise on Bridge Building. | 8vo, | 3 00
Whithard, P. Illuminating and Missal Painting. | 12mo, | 1 50
Wilkinson, H. D. Submarine Cable Laying and Repairing. | 8vo, | *6 00
Williams, A. D., Jr., and Hutchinson, R. W. The Steam Turbine. | (In Press.) |
Williamson, R. S. On the Use of the Barometer. | 4to, | 15 00
—— Practical Tables in Meteorology and Hypsometery. | 4to, | 2 50
Willson, F. N. Theoretical and Practical Graphics. | 4to, | *4 00
Wimperis, H. E. Internal Combustion Engine. | 8vo, | *3 00
Winchell, N. H., and A. N. Elements of Optical Mineralogy. | 8vo, | *3 50
Winkler, C., and Lunge, G. Handbook of Technical Gas-Analysis. | 8vo, | 4 00
Woodbury, D. V. Elements of Stability in the Well-proportioned Arch. | 8vo, half morocco, | 4 00
Worden, E. C. The Nitrocellulose Industry. Two Volumes. | 8vo (In Press.) |
Wright, A. C. Analysis of Oils and Allied Substances. | 8vo, | *3 50
—— Simple Method for Testing Painters’ Materials. | 8vo, | *2 50
Wright, H. E. Handy Book for Brewers. | 8vo, | *5 00
Wright, F. W. Design of a Condensing Plant. | 12mo, | *1 50
Wright, T. W. Elements of Mechanics. | 8vo, | *2 50
Wright, T. W., and Hayford, J. F. Adjustment of Observations. | 8vo, | *3 00
Young, J. E. Electrical Testing for Telegraph Engineers. | 8vo, | *4 00
Zeidler, J., and Lustgarten, J. Electric Arc Lamps. | 8vo, | *2 00
Zeuner, A. Technical Thermodynamics. Trans. by J. F. Klein. Two Volumes. | 8vo, | *8 00
Zimmer, G. F. Mechanical Handling of Material. | 4to, | *10 00
Zipser, J. Textile Raw Materials. Trans. by C. Salter. | 8vo, | *5 00
Zur Nedden, F. Engineering Workshop Machines and Processes. Trans. by J. A. Davenport. | 8vo, | *2 00

Transcriber’s Note

This book catalog was originally part of the book Physical Significance of Entropy or of the Second Law, by J. F. Klein.

Punctuation has been normalized. Variations in hyphenation have been retained as they were in the original publication. The following changes have been made:

Joly, J. Raidoactivity —> Radioactivity

Petrol Air Gas —> Petrol Air-Gas