                                                            MFDPRT.LIT


          FUNCTION:


               To  create  an  ASCII file (that may be printed) for the MFD
          (Master File Directory) on a specified device.


          HINTS/RESTRICTIONS:


               MFDPRT may be run from any account on the  system  and  will
          function for any device on the system.


               MFDPRT  will  create  the  ASCII file in the account you are
          currently logged into under the filespec of {device}.MFD.


          FORMAT:


               .MFDPRT {device:}


               The device may be any device that the driver is resident for
          and is currently on the system. Multiple digit drive numbers  are
          permitted.


          DEFAULTS:


               If  no  device is specified, then MFDPRT will default to the
          device you are currently logged into.


          OPERATION:

               1.  Type MFDPRT followed by the device you wish to print.

               2.  MFDPRT will create an ASCII file with a filespec of  the
                   device  and  an extension of .MFD in the account you are
                   currently logged into.



          ERRORS:

               A.  ^specification error:

                        Your command line was of incorrect  format.  The  ^
                   points to the location that MFDPRT does not understand.

               B.  All other error messages are from AMOSL operating system




                                     1
          CHARACTERISTICS:


               You  can  use  MFDPRT to create a sequential file so you can
          have printed copy of any block on any mounted device.


               MFDPRT is both re-entrant and reusable.


               MFDPRT is control C (^C) interruptable, if CTRLC is  SET  on
          the user's terminal.


               MFDPRT  will display the PPN designation in octal format, to
          be consistant with the operating system.


          EXAMPLES:


               .MFDPRT DSK1:
               MFD print on device: DSK1:
               MFD print has been initiated on log-device:DSK1.MFD
               Printing output file.
               Output file completed.



                                        MFDPRT.LIT was written by:
                                        Quaker State Oil Refining Corp.
                                        Research Center
                                        Oil City, PA  16301 - April 1984




























                                     2

.
