                                                            FORMS.LIT


          FUNCTION:


               To determine the current forms SETting for  all the printers
          on the system.


          HINTS/RESTRICTIONS:


               FORMS  will run from any account on the system and will work
          for any number of spoolers that are initialized and running.


          FORMAT:


               .FORMS


               There are no calling arguments or switches available.


          OPERATION:


               Type FORMS, the printers and the current forms SET  will  be
          displayed.


          ERRORS:


               All error messages are from AMOSL operating system.


          CHARACTERISTICS:


               You  can  use  FORMS to determine the current forms that are
          SET for each printer on the system. Use SET FORMS to  change  the
          setting  (see  SET  in the System Commands Reference Manual) then
          use FORMS to display the new setting.


               FORMS is both re-entrant and reusable.


               FORMS is control C (^C) interruptable, if CTRLC  is  SET  on
          the user's terminal.








                                     1
          EXAMPLES:


               .FORMS
               Printer         Forms

               TI810           NORMAL

               DIABLO          CHECKS

               LETTER          LHEADS






                                        FORMS.LIT was written by:
                                        Quaker State Oil Refining Corp.
                                        Research Center
                                        Oil City, PA  16301 - March 1984








































                                     2

.
