		MacroTech SIG     DSK2:[100,144]

ADDIAG HLP 2    Troubleshooting guide to ADIT board
ADIT   DID 1    ?
ADIT   IDV 6    ADIT interface driver-DMA support
ADIT   M68 38   ADIT interface driver source-DMA support
ADITC  IDV 8    ADIT interface driver - COMSER support (1990)
ADITC  M68 74   ADIT interface driver - COMSER support (1990)
ADITC  OLD 64   ADIT interface driver - COMSER support (1988)
ADITIO M68 14   ADIT interface driver - beta release, no DMA support
ADTEST CMD 2    Cyclical test for ADIT board
ADTEST HLP 2    Documentation for ADTEST
ADTEST INI 6    Sample boot .INI file for ADIT board
ANDLYN LIT 67   Archived files
ANDLYN DOC 1	Listing of files in ANDLYN.LIT
APU    ASD 1    Rev 1.0, for use with AUTOLOG
APU    DIR 2    Listing of all APU16 related files
APU    HLP 3    Documentation for APU16 files
APU    IDV 12   Rev 1.1 APU16 interface driver
APU    OLD 7    ?
APUHDR IDV 8    ?
APUOLD IDV 7    ?
APUTST CMD 1    Test for APU16 - forces BARBER to APU16
APUTST INI 7    Sample boot .INI file for APU16
BARBER LIT 4    Test routine used with APUTST and ADTEST
DATSTP BAS 1    ? MAP statements
FLOW   LIT 1    XON/XOFF-force job flow on/off
MACROT DOC 7    Documentation about MacroTech's products and files on AMUS network
MARK   LIT 85   Archived files
MARK   DOC 1	Listing of files in MARK.LIT
MAXTST LIT 2    User friendly memory test
MIPARC LIT 66   Archived files
MIPARC DOC 1	Listing of files in MIPARC.LIT
MT     LIT 10   Flexible (undocumented) memory test
NETSIO NDV 9    ?
READ   ME  4    Listing of MacroTech files
SETAPU LIT 2    Use with APU.IDV
SLAVE  LIT 28   For AUTOLOG users
SPEED  LIT 3    Like BAUD.LIT
VIPARC LIT 67   Archived files
VIPARC DOC 1	Listing of files in VIPARC.LIT
VIP121 LIT 48   Archived files
VIP121 DOC 1	Listing of files in VIP121.LIT
WHOAA  LIT 1    Enables reverse hardware handshaking
Total of 47 files in 837 blocks



.
