				ADTEST

	    Quick and dirty test for the ADIT I/O board.


	* Boot using ADTEST.INI or similar initialization.

	* From a /L port, force "Barber" to all the ADIT
	  ports using ADTEST.CMD or equivalent.

	* Monitor the "Adit" jobs with STAT.LIT from one
	  of the /L ports.

	* Kill all the "Adit" ports with ADKILL.CMD from
	  one of the /L ports.

	* All of the "Adit" jobs should return to "^C Ti".
	  Due to the way BARBER.LIT is written, it will
	  take a minute or two for all jobs to return to
	  the monitor level.

.
