                                VCRDOC
                                ------

VCRDOC creates a formatted  report for the contents of a VCR tape.  The
tape header is used as the report header.  It is organized sequentially
by device, then account.  It gives the full filename with extension and
size in blocks, with five columns per page, and subtotals by device and
account.  VCR DOC starts a new  page  for  each  different  device  and
account, gives the grand totals by device and at the end of the report,
and numbers the pages.  

         Language :  Alpha Basic          
         Memory   :  20KB
         Disk     :  < 100 Blocks for programs + VCRLST.LST space


                          VCRDOC Installation
                          -------------------

                    Copy VCRDOC.RUN into DSK0:[7,6]
                    Copy VCRDOC.DO  into DSK0:[2,2]
                             VCRDOC Usage
                             ------------

Enter the following command from AMOS level:

    VCRDOC [<optional-list-file-name>] [<optional-work-file-name>]

In  its simplest form of use, VCRDOC may be entered with no parameters. 
If it is to be used repetitively, then at least the optional-list-file-
name should be specified  so  that  the  output  of  one  run  will not
over-write the output of the next run before printing is complete.

<optional-list-file-name>  is  a  1  to  6 character file name (without
extension) which specifies the name to be given to the formatted output
file. This file will be spooled to the system printer and deleted after
printing.  The default value os this name is VCRLST.

<optional-work-file-name>  is  a 1 to 6 character  file  name  (without
extension) which specifies the name to be given to the unformatted work
file produced by the VCRDIR program.   This file will be  deleted after
processing.  The default value of this name is VCRLST.


After having entered the VCRDOC command,  you  will be prompted through
the execution of a VCRDIR (Alpha Microsystems, Inc.  VCR Tape Directory
Program.)  This causes the directory of the video tape to be written to
disk.  As soon as this is done, the VCRDOC.RUN program  is  executed to
reformat the Alpha Microsystems, Inc. format into a more useable form.













(C) 1985 Sterling Quality Software, Inc.  All rights reserved. 

Permission is granted to any individual or institution to copy or use this
software and the routines described in it, except for explicitly commercial
purposes. This software must not be sold to any person or institution.

*************************** D I S C L A I M E R ***************************
*   No warranty of the software or of the accuracy of the documentation   *
*   surrounding it is expressed or implied, and neither the authors,      *
*   Sterling Quality Software, Inc. nor AMUS acknowledge any liability    *
*   resulting from program or documentation errors.                       *
***************************************************************************

Suggestions or problems may be forwarded to:

	Sterling Quality Software, Inc.
	11739 Bowman Green Drive
	Reston, VA 22090
	(703) 478-0538




.
