                     ISIS-Kermit Version 3

This document describes the contents of the ISIS-Kermit, version 3 files.

The file types are as follows:

	 .BLD - Instructions on building ISIS Kermit
	 .BWR - "Beware" notes and future considerations
	 .CSD - ISIS command files
	 .DOC - ISIS kermit documentation
	 .HLP - Text files containing release notes (NOT machine help)
	 .P80 - PL/M-80 source files

See in particular MDSMIT.BLD for installation instructions and MDSMIT.DOC
for user instructions.

.
