Euro PVM Phosphorus

Euro PVM Phosphorus

Euro PVM Phosphorus

Euro PVM Phosphorus

Euro PVM Phosphorus

Euro PVM Phosphorus

Euro PVM Phosphorus

Euro PVM Phosphorus

Euro PVM Phosphorus

Euro PVM Phosphorus

Euro PVM Phosphorus__________________________________________' France T�l�com ¥ ENST ¥ Octobre 1994 15Conclusions, Future Work¥70% of the system has been prototyped in C on a network ofSUN 4 workstation (7000 lignes of C code).¥The first performance tests are encouraging.¥We will continue the development and :-work on the support of shared structures.-tune the implementation for better performance.-evaluate several consistency models.-caracterise the sharing patterns that can benefit from thesupport of Phosphorus and the protocols adapted to thesepatterns.-bring the system to a point where it can be used by others(for teaching and research purposes).