\documentstyle{article}
\textheight 9.75in 
\textwidth 6in 
\topmargin -.75 in
\footskip .75in 
\oddsidemargin .25 in
\begin{document}
\begin{titlepage}
\vskip .55 in
\begin{center}
{\large
ARGONNE NATIONAL LABORATORY\\
}
9700 South Cass Avenue\\
Argonne, Illinois 60439-4801
\end{center}
\vskip 1.5 in
\begin{center}
{\large\bf
ADVANCED COMPUTER ARCHITECTURES
}
\end{center}
\vskip .35 in
\begin{center}
{\em
Jack J. Dongarra and Iain S. Duff
}
\vskip .25 in
Mathematics and Computer Science Division
\vskip .75 in
August 1989
\end{center}
\vskip .25 in
\begin{center}
Technical Memorandum No. 57 (Revision 2)
\end{center}
\vfill
{\small
This work was supported by
the
Applied Mathematical Sciences subprogram of the Office of Energy Research,
U.S. Department of Energy, under Contract W-31-109-Eng-38.
}
\end{titlepage}

\end{document}


.
