%
%   Preamble
%
\documentstyle[11pt,leqno]{article}
\setlength{\textwidth}{433.6pt}
\setlength{\oddsidemargin}{23pt}
\setlength{\evensidemargin}{23pt}
\setlength{\topmargin}{0.0pt}
\setlength{\textheight}{614pt}

%
%
%   Beginning of document
%
\begin{document}
\setlength{\baselineskip}{16pt}

\par\noindent
\vspace{1.75in}


\setlength{\baselineskip}{16pt}

\par\noindent
 
\pagestyle{plain}
\setcounter{page}{1}
\vspace{1.2in}
\pagenumbering{arabic}


\pagebreak
\input abstract
\pagebreak
\input alliant
\pagebreak
\input amdahl
\pagebreak
\input ametek
\pagebreak
\input amt
\pagebreak
\input ardent
\pagebreak
\input bbn
\pagebreak
\input cdc190
\pagebreak
\input cdc205
\pagebreak
\input convex
\pagebreak
\input cray1
\pagebreak
\input cray2
\pagebreak
\input cray3
\pagebreak
\input crayxmp
\pagebreak
\input crayymp
\pagebreak
\input culler
\pagebreak
\input cyberplus
\pagebreak
\input cydrome
\pagebreak
\input elxsi
\pagebreak
\input encore
\pagebreak
\input eta10
\pagebreak
\input flex
\pagebreak
\input fps1
\pagebreak
\input fps2
\pagebreak
\input fps3
\pagebreak
\input fps4
\pagebreak
\input fpst
\pagebreak
\input galaxy
\pagebreak
\input goodyear
\pagebreak
\input gould
\pagebreak
\input hitachi
\pagebreak
\input ibm3090
\pagebreak
\input intel
\pagebreak
\input ip1
\pagebreak
\input isis
\pagebreak
\input ksr
\pagebreak
\input loral
\pagebreak
\input meiko
\pagebreak
\input multiflow
\pagebreak
\input myrias
\pagebreak
\input nas
\pagebreak
\input ncube
\pagebreak
\input nec
\pagebreak
\input prevec
\pagebreak
\input ps2000
\pagebreak
\input saxpy
\pagebreak
\input scs
\pagebreak
\input sequent
\pagebreak
\input sequent2
\pagebreak
\input sgi
\pagebreak
\input startech
\pagebreak
\input stellar
\pagebreak
\input supertek
\pagebreak
\input tmc
\pagebreak
\input unisys
\pagebreak

\pagebreak
\end{document}

.
