TOP500 6/96

Ó UniversitätMannheim

Convex

CrayDEC

Fujitsu

Hitachi

IBMIntelKSR

Meiko NEC Parsytec

SGITMC

0%

5%

10%

15%

20%

25%

Number of systems installed

Total: 500