%% Plain TeX example of poligraf
\special{papersize=190mm,277mm}
%\special{papersize=180mm,267mm} % try together with \xoffset and \yoffset
%% --
\hsize5.5in \vsize8in
\input epsf           % standard dvips distribution
\input colordvi       % standard dvips distribution
\input poligraf.sty
%% -- change some options ------
%\NoOverPrintBlack    % default is overprint black
%\Separate\CYAN       % or
%\Separate\MAGENTA    % or
%\Separate\YELLOW     % or
%\Separate\BLACK

%\xoffset{5}          % additional x an y offsets for printing on standard
%\yoffset{5}          % printer (do not use it for typesetters!)
%\cropmarkdistance{5} % 1--5 (default 3mm)
%\cropmarksize{10}    % default 10mm
%\barsize{6}          % default 6mm
%\nocolorbars         % no color bars and scales
%\onlycolorsteps      % color steps only
%\onlycolorbars       % color bars only
%\mirror              % mirror switch
%\labeloff            % no page label

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\def\text{
\Black{This is example of test page. This is example of test page.
This is example of test page. This is example of test page.
This is example of test page. This is example of test page.}\par
\Red{This is example of test page. This is example of test page.
This is example of test page. This is example of test page.
This is example of test page. This is example of test page.}\par
\Blue{This is example of test page. This is example of test page.
This is example of test page. This is example of test page.
This is example of test page. This is example of test page.}\par
\Green{This is example of test page. This is example of test page.
This is example of test page. This is example of test page.
This is example of test page. This is example of test page.}
}

\text
\bigskip

\centerline{\epsffile{kol-cmyk.eps}}
\vskip -10mm
\centerline{\bf THIS TEXT IS BLACK}

\bye

.
