\documentstyle[graphics,a4wide]{report}
\nofiles
\begin{document}

text before graph

\setlength{\unitlength}{1mm}\rule{1in}{0.4pt}
\gino(150,100){TEST.SIX}

text after graph

\end{document}

.
