\hypertarget{classDviFilePreamble}{\section{Dvi\-File\-Preamble Class Reference}
\label{classDviFilePreamble}\index{Dvi\-File\-Preamble@{Dvi\-File\-Preamble}}
}


The preamble to the D\-V\-I file.  




{\ttfamily \#include $<$Dvi\-File.\-h$>$}

Inheritance diagram for Dvi\-File\-Preamble\-:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=2.000000cm]{classDviFilePreamble}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hyperlink{classDviFilePreamble_acce4e5c7670eb9c67c3ca5dd842e80ea}{Dvi\-File\-Preamble} ()
\item 
void \hyperlink{classDviFilePreamble_a126d04e04075feb11eab29022c2ebefd}{debug} () const 
\begin{DoxyCompactList}\small\item\em Writes a representation of this event on cerr. \end{DoxyCompactList}\end{DoxyCompactItemize}
\subsection*{Public Attributes}
\begin{DoxyCompactItemize}
\item 
unsigned int \hyperlink{classDviFilePreamble_ac31d883d62ab9afdfdeea53b38e434d9}{dvi\-Type}
\begin{DoxyCompactList}\small\item\em The D\-V\-I file identification byte. \end{DoxyCompactList}\item 
unsigned int \hyperlink{classDviFilePreamble_aad67ffc154890ccf0e27cd038f92661d}{num}
\begin{DoxyCompactList}\small\item\em The numerator of the fraction defining the standard of measurement. \end{DoxyCompactList}\item 
unsigned int \hyperlink{classDviFilePreamble_aead4531ce69ad0c340311a0e93f1a43a}{den}
\begin{DoxyCompactList}\small\item\em The denominator of the fraction defining the standard of measurement. \end{DoxyCompactList}\item 
unsigned int \hyperlink{classDviFilePreamble_a41471546508ccbe4d1bead859026bce0}{mag}
\begin{DoxyCompactList}\small\item\em Magnification specification. \end{DoxyCompactList}\item 
string \hyperlink{classDviFilePreamble_a68379bc31f748d83f6fda51bc2f9068f}{comment}
\begin{DoxyCompactList}\small\item\em The D\-V\-I file comment, as a string. \end{DoxyCompactList}\end{DoxyCompactItemize}
\subsection*{Additional Inherited Members}


\subsection{Detailed Description}
The preamble to the D\-V\-I file. 

\subsection{Constructor \& Destructor Documentation}
\hypertarget{classDviFilePreamble_acce4e5c7670eb9c67c3ca5dd842e80ea}{\index{Dvi\-File\-Preamble@{Dvi\-File\-Preamble}!Dvi\-File\-Preamble@{Dvi\-File\-Preamble}}
\index{Dvi\-File\-Preamble@{Dvi\-File\-Preamble}!DviFilePreamble@{Dvi\-File\-Preamble}}
\subsubsection[{Dvi\-File\-Preamble}]{\setlength{\rightskip}{0pt plus 5cm}Dvi\-File\-Preamble\-::\-Dvi\-File\-Preamble (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily [inline]}}}\label{classDviFilePreamble_acce4e5c7670eb9c67c3ca5dd842e80ea}


\subsection{Member Function Documentation}
\hypertarget{classDviFilePreamble_a126d04e04075feb11eab29022c2ebefd}{\index{Dvi\-File\-Preamble@{Dvi\-File\-Preamble}!debug@{debug}}
\index{debug@{debug}!DviFilePreamble@{Dvi\-File\-Preamble}}
\subsubsection[{debug}]{\setlength{\rightskip}{0pt plus 5cm}void Dvi\-File\-Preamble\-::debug (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
) const\hspace{0.3cm}{\ttfamily [virtual]}}}\label{classDviFilePreamble_a126d04e04075feb11eab29022c2ebefd}


Writes a representation of this event on cerr. 



Reimplemented from \hyperlink{classDviFileEvent_aaf083953d65851e339db881643e77260}{Dvi\-File\-Event}.



References comment, and den.



\subsection{Member Data Documentation}
\hypertarget{classDviFilePreamble_a68379bc31f748d83f6fda51bc2f9068f}{\index{Dvi\-File\-Preamble@{Dvi\-File\-Preamble}!comment@{comment}}
\index{comment@{comment}!DviFilePreamble@{Dvi\-File\-Preamble}}
\subsubsection[{comment}]{\setlength{\rightskip}{0pt plus 5cm}string Dvi\-File\-Preamble\-::comment}}\label{classDviFilePreamble_a68379bc31f748d83f6fda51bc2f9068f}


The D\-V\-I file comment, as a string. 



Referenced by debug(), and Dvi\-File\-::get\-Event().

\hypertarget{classDviFilePreamble_aead4531ce69ad0c340311a0e93f1a43a}{\index{Dvi\-File\-Preamble@{Dvi\-File\-Preamble}!den@{den}}
\index{den@{den}!DviFilePreamble@{Dvi\-File\-Preamble}}
\subsubsection[{den}]{\setlength{\rightskip}{0pt plus 5cm}unsigned int Dvi\-File\-Preamble\-::den}}\label{classDviFilePreamble_aead4531ce69ad0c340311a0e93f1a43a}


The denominator of the fraction defining the standard of measurement. 



Referenced by debug(), and Dvi\-File\-::get\-Event().

\hypertarget{classDviFilePreamble_ac31d883d62ab9afdfdeea53b38e434d9}{\index{Dvi\-File\-Preamble@{Dvi\-File\-Preamble}!dvi\-Type@{dvi\-Type}}
\index{dvi\-Type@{dvi\-Type}!DviFilePreamble@{Dvi\-File\-Preamble}}
\subsubsection[{dvi\-Type}]{\setlength{\rightskip}{0pt plus 5cm}unsigned int Dvi\-File\-Preamble\-::dvi\-Type}}\label{classDviFilePreamble_ac31d883d62ab9afdfdeea53b38e434d9}


The D\-V\-I file identification byte. 

Always 2 for D\-V\-I files produced by standard Te\-X. 

Referenced by Dvi\-File\-::get\-Event().

\hypertarget{classDviFilePreamble_a41471546508ccbe4d1bead859026bce0}{\index{Dvi\-File\-Preamble@{Dvi\-File\-Preamble}!mag@{mag}}
\index{mag@{mag}!DviFilePreamble@{Dvi\-File\-Preamble}}
\subsubsection[{mag}]{\setlength{\rightskip}{0pt plus 5cm}unsigned int Dvi\-File\-Preamble\-::mag}}\label{classDviFilePreamble_a41471546508ccbe4d1bead859026bce0}


Magnification specification. 

1000 times the desired magnification factor. 

Referenced by Dvi\-File\-::get\-Event().

\hypertarget{classDviFilePreamble_aad67ffc154890ccf0e27cd038f92661d}{\index{Dvi\-File\-Preamble@{Dvi\-File\-Preamble}!num@{num}}
\index{num@{num}!DviFilePreamble@{Dvi\-File\-Preamble}}
\subsubsection[{num}]{\setlength{\rightskip}{0pt plus 5cm}unsigned int Dvi\-File\-Preamble\-::num}}\label{classDviFilePreamble_aad67ffc154890ccf0e27cd038f92661d}


The numerator of the fraction defining the standard of measurement. 



Referenced by Dvi\-File\-::get\-Event().



The documentation for this class was generated from the following files\-:\begin{DoxyCompactItemize}
\item 
\hyperlink{DviFile_8h}{Dvi\-File.\-h}\item 
\hyperlink{DviFile_8cc}{Dvi\-File.\-cc}\end{DoxyCompactItemize}

.
