LIBRARY opencore_amrnb
EXPORTS
	Decoder_Interface_Decode
	Decoder_Interface_exit
	Decoder_Interface_init
	Encoder_Interface_Encode
	Encoder_Interface_exit
	Encoder_Interface_init
.
