B ObtainingSoftware

Introduction This appendix outlines the procedures for obtaining NCSA Mosaic for X Window System platforms.

Sources for NCSA Mosaic NCSA Mosaic software and manuals are available for free if you download them from the NCSA anonymous FTP server. See the next two sections for complete instructions on how to download. Software and documentation is also available for purchase through the

NCSA Technical Resources Catalog

. All orders must be prepaid. To obtain a copy of the catalog, contact NCSA Orders by electronic mail at orders@ncsa.uiuc.edu, by phone at (217) 244-4130, or by U.S. mail at: NCSA Orders 152 Computing Applications Building 605 East Spring�eld Avenue Champaign, IL 61820-5518

How to FTP If you are connected to the Internet you can download NCSA Mosaic for X Window System software and documentation at no charge from an anonymous File Transport Protocol (FTP) server at NCSA. Follow the steps below. If you have any questions regarding the connection or procedure, consult your local system administrator or network expert. 1. Log on to a host at your site that is connected to the Internet and is running software supporting the ftp command.

2. Invoke FTP (on most systems) by entering the Internet address of the server: %ftp ftp.ncsa.uiuc.edu 3. Log on by enteringanonymous for the name. 4. Enter your local login name and address (e.g., rsmith@ncsa.uiuc.edu) for the password.

5. EntergetREADME.FIRST to transfer the instructions �le (in ASCII) to your local host.

6. Enterquit to exit FTP and return to your local host.

B-2NCSA Mosaic for X Window System User Guide

7. Review theREADME.FIRST �le for complete instructions concerning the organization of the FTP directories and the procedures you should follow to download theREADME �les speci�c to the application you want.

Your logon session should resemble the following sample, where the remote user’s name isrsmith@ncsa.uiuc.edu and user entries are indicated in boldface type. (The text of theREADME.FIRST �le will likely be different because it is updated periodically.)

%ftp ftp.ncsa.uiuc.edu Connected to zaphod. 220 zaphod FTP server (Version 6.23 Thu Apr 8 06:37:40 CDT 199x) ready. Name (ftp.ncsa.uiuc.edu: rsmith):anonymous Password: 230- 230-Welcome to NCSA’s anonymous FTP server! I hope you find what you are 230- looking for. For questions regarding NCSA software tools, please e-mail 230- softdev@ncsa.uiuc.edu. 230- 230-Note to HyperFTP users: If you log in, and cannot list directories 2 3 0 - o t h e r t h a n t h e t o p - l e v e l o n e s , e n t e r a - a s t h e f i r s t c h a r a c t e r o f y o u r 230- password (e-mail address). 230- 230-If your ftp client has problems with receiving files from this server, send 230- a - as the first character of your password (e-mail address). 230- 230-If you’re ftp’ing from Delphi, please remember that the Delphi FTP client 230- requires you to enclose case-sensitive directory and file names in 230- double quote (") characters. 230- 230-Please read the file README 230- it was last modified on Tue Jul 23 15:40:50 199x - 1030 days ago 230-Please read the file README.BROCHURE 230- it was last modified on Sat Sep 12 18:30:42 199x - 613 days ago 230-Please read the file README.FIRST 230- it was last modified on Sun Oct 3 17:45:17 199x - 228 days ago 230-Please read the file README_Dialin 230- it was last modified on Wed Sep 2 14:21:17 199x - 623 days ago 230 Guest login ok, access restrictions apply. ftp>get README.FIRST 200 PORT command successful. 150 Opening ASCII mode data connection for README.FIRST (10283 bytes). 226 Transfer complete. local: README.FIRST remote: README.FIRST 11066 bytes received in .34 seconds (32 Kbytes/s) ftp>quit TheREADME.FIRST �le provides general information about how to retrieve �les from the NCSA anonymous FTP server. To retrieve NCSA Mosaic for X Window System, log on again and enter the commands shown in boldface

Obtaining SoftwareB-3

below. (The �le names may be slightly different, especially if newer versions have been released.) Thel s command returns a listing of �les in the current directory.

If you want the executable binary, change to thebinaries directory. If you want the source, change to thesource directory. Viewers (see xref) and various documentation are available in the respective directories. (In this example, the user is retrieving binaries for an SGI IRIX 4.x system.)

ftp>cd Mosaic/Unix/binaries/2.5 250 CWD command successful. ftp>l s 200 PORT command successful. 150 Opening ASCII mode data connection for file list. Mosaic-alpha-1.3-2.5b4.Z Mosaic-sgi-2.5b4.Z Mosaic-alpha-3.0-2.5b4.Z Mosaic-solaris-2.5b4.Z Mosaic-dec-2.5b4.Z Mosaic-sun-2.5b4.Z Mosaic-hp-2.5b4.Z Mosaic-sun-lresolv-2.5b4.Z Mosaic-ibm-2.5b4.Z README-2.5b4 Mosaic-indy-2.5b4.Z ftp>bin ftp>get Mosaic-sgi-2.5b4.Z 200 PORT command successful. 150 Opening binary mode data connection for get Mosaic-sgi-2.5b4.Z (1493631 bytes). 226 Transfer complete. local: Mosaic-sgi-2.5b4.Z remote: Mosaic-sgi-2.5b4.Z 1493631 bytes received in 15 seconds ftp>quit 221 Goodbye. %uncompress Mosaic-sgi-2.5b4.Z %chmod 775 Mosaic-sgi-2.5b4 %