The Network Information Center On Line Aid System (NICOLAS)

A Address:

dvanced Data Flow Technology Office N Code 930.4

ASA Goddard Space Flight Center

E Greenbelt, MD 20771

mail: dftnic@dftnic.gsfc.nasa.gov

D

Phone: (301) 286-9514

escription NICOLAS is a menu-driven network user help system that functions both as an information s f server and an inter-network gateway. As an information server, NICOLAS provides syntaxe or inter-network mail addressing, general information about wide-area networks, networking- - a related "how to" files, information on current NASA flight projects, and a variety of network nd computer-related information of specific interest to the NASA community. As an n automated inter-network gateway, NICOLAS enables users to connect to DECnet or TCP/IP odes, login to their NASAMail and GSFCMail accounts, connect directly to a number of p other online services not normally available to TCP/IP users, perform a variety of "yellow ages" functions, and transfer files between DECnet and TCP/IP systems and from either DEC-

N net or TCP/IP nodes to BITNET nodes.

etwork Access Access is made via TELNET to dftnic.gsfc.nasa.gov with the username "dftnic"; no password

W is required. Access can also be made in DECnet via SET HOST to DFTNIC.

ho Can Use NICOLAS: Although NICOLAS is intended primarily for use by NASA employees, researchers, and con-

M tractors, all services are available to users of the Internet and SPAN.

iscellaneous Information: NICOLAS is hosted on a VAX 8250 which is accessible for remote logins via both TCP/IP and DECnet, and which is also a node on BITNET.

The information in this section is provided in accordance with the copyright notice appearing at the front of this guide.

August 3, 1990 NNSC Section 3.17, Page